SCHEDULES

SCHEDULE 14 Measurement methods and calculations for refrigerating appliances

6 Compensation factors per compartment type in the calculation of SAE:
Table 19 sets out the compensation factors per compartment type.

Table 19 Values of compensation factors per compartment type
Compartment type	Ac	Ac	Bc	Bc	D			
	Manual defrost	Auto-defrost	Freestanding appliance	Built-in appliance	≤ 2	3	4	> 4
Pantry	1		1	1.02	1	1.02	1.035	1.05
Wine storage								
Cellar								
Fresh food								
Chill				1.03				
0-star and ice-making	1	1.10		1.05				
1-star								
2-start								
3-star								
Freezer (4-star)								
For the purposes of Table 19, the numbers in the second row of the column headed “D” are the number of external doors or compartments, whichever is lower.