This draft Statutory Instrument supersedes the draft of the same title which was laid before Parliament and published on 15 October 2020 (ISBN 978-0-348-21380-5). It is being issued free of charge to all known recipients of that draft Statutory Instrument.
Draft Regulations laid before Parliament under paragraphs 1(1) and 8F(1) of Schedule 7 to the European Union (Withdrawal) Act 2018, for approval by resolution of each House of Parliament.
2020 No.
Exiting The European Union
Consumer Protection
The Medical Devices (Amendment etc.) (EU Exit) Regulations 2020
Made ***
Coming into force in accordance with regulation 1(2) and (3)

The Secretary of State makes these Regulations in exercise of the powers conferred by sections 8(1) and 8C of, paragraphs 1(1)(ab) and 7(2) of Schedule 4, and paragraph 21 of Schedule 7 to, the European Union (Withdrawal) Act 2018 and section 41(1) of the European Union (Withdrawal Agreement) Act 2020.
2018 c. 16. The European Union (Withdrawal) Act 2018 was amended by the European Union (Withdrawal Agreement) Act 2020 (c. 1) (“the 2020 Act”). Section 8C was inserted by section 21 of the 2020 Act, and paragraph 1(1)(ab) of Schedule 4 by section 28 of that Act. Paragraph 21 of Schedule 7 was amended by paragraph 53(2) of Schedule 5 to the 2020 Act.
2020 c. 1.
A draft of this instrument has been approved by a resolution of each House of Parliament, in accordance with paragraphs 1(1) and 8F(1) of Schedule 7 to the European Union (Withdrawal) Act 2018.
Paragraph 8F was inserted by paragraph 51 of Schedule 5 to the 2020 Act.
The Treasury has consented to the making of these Regulations as required by paragraphs 3(1) and 10 of Schedule 4 to the European Union (Withdrawal) Act 2018.