3 Wards of the London Borough of Richmond upon Thames and number of councillors
1 The existing wards of the London Borough of Richmond upon Thames are abolished.
2 The London Borough of Richmond upon Thames is divided into the 18 wards listed in the Schedule.
3 Each ward comprises the area identified on the map by reference to the name of the ward.
4 The number of councillors to be elected for each ward is three.