SCHEDULE 7 Hospitals and small emitters

PART 4 Emissions targets

15 Emissions targets other than for hospital-qualifying installations may not exceed maximum amount
(1) Except in the case of a hospital-qualifying installation, an emissions target for a scheme year may not exceed the maximum amount.
(2) This paragraph overrides paragraphs 16 and 17.