SCHEDULE 7 Hospitals and small emitters

PART 3 Hospital or small emitter permits

14 Former ultra-small emitters: hospital or small emitter permits coming into force after beginning of scheme year
(1) This paragraph applies where a hospital or small emitter permit for an installation referred to in paragraph 4(2) or (3) comes into force on a day after 1st January in the relevant scheme year.
(2) References in paragraph 11(2) to a scheme year for which the installation is a hospital or small emitter must be treated as not including a reference to the part of the relevant scheme year before the date on which the permit comes into force.
(3) The installation’s emissions target for the relevant scheme year is the emissions target calculated under paragraph 16 or, as the case may be, 17 multiplied by the factor set out in sub-paragraph (4).
(4) The factor is (Y – D)/Y, where—
Y is the number of days in the relevant scheme year;
D is the number of days in the relevant scheme year before the date on which the permit comes into force.
(5) Paragraph 19 has effect as if the reference to the installation’s reportable emissions in the relevant scheme year were a reference to the installation’s reportable emissions in the relevant scheme year on and after the date on which the permit comes into force.
(6) In this paragraph, “relevant scheme year” has the meaning given in paragraph 4(1)(b).