PART 7 Enforcement

CHAPTER 2 Civil penalties

56 Hospitals and small emitters: under-reporting of emissions
1 The operator of an installation is liable to a civil penalty where the installation has unreported emissions in a scheme year for which the installation is a hospital or small emitter, that is to say reportable emissions in the scheme year that—
(a) are not reported in the emissions report submitted for the scheme year under paragraph 11(2)(b) of Schedule 7; but
(b) are determined by the regulator under article 45.
2 The civil penalty is £5,000 + (UE x CP), where—
UE is the unreported emissions in the scheme year (in tonnes of carbon dioxide equivalent);
CP is the carbon price for the scheme year.