PART 3 Payments administered by the Settlement Body

CHAPTER 2 Modifications to application of Principal Regulations: agreements existing on 15th November 2018

12 Interpretation: modifications
Regulation 2 (interpretation) of the Principal Regulations applies as if in paragraph (1), in the appropriate places, there were inserted the following definitions—
(a) “conditional agreement auction” has the meaning given in regulation 2(1) of the Electricity Capacity (No. 1) Regulations 2019;
(b) “deferred capacity payment trigger event” has the meaning given in regulation 2(1) of the Electricity Capacity (No. 1) Regulations 2019;
(c) “standstill month” has the meaning given in regulation 2(1) of the Electricity Capacity (No. 1) Regulations 2019;
(d) “standstill period” has the meaning given in regulation 3 of the Electricity Capacity (No. 1) Regulations 2019.