SCHEDULE 34 Amendment of Regulation (EC) No 1223/2009 and related amendments

10 Amendment of Article 10
In Article 10 (safety assessment)—
(a) in paragraph 1 omit the words from “The first subparagraph shall” to “referred to in Article 32(2).”;
(b) in paragraph 2 for “a Member State” substitute “the Secretary of State”;
(c) in paragraph 3—
(i) for the words from “shall comply with” to “study” substitute “must comply with the Good Laboratory Practice Regulations 1999”;
S.I. 1999/3106; regulation 2(1) was amended by S.I. 2004/994; there are some other amendments not relevant to these Regulations.
(ii) before “international standards” omit “other”;
(iii) for “Commission or the ECHA” substitute “Secretary of State”.