SCHEDULE 26 Amendment of the Non-automatic Weighing Instruments Regulations 2016

27 Amendment to regulation 41
For regulation 41 (regulated instruments that require more than one declaration of conformity) substitute—

“41 Where a non-automatic weighing instrument is subject to more than one enactment requiring the drawing up of a declaration of conformity, the manufacturer must draw up a single declaration of conformity which identifies each enactment by its title.”

.