SCHEDULE 26 Amendment of the Non-automatic Weighing Instruments Regulations 2016

17 Amendment to regulation 23
In regulation 23 (requirement for importer to keep copy of EU declaration of conformity) and in the heading to that regulation, omit “EU”.