1 Citation and commencement
1 These Regulations may be cited as the Gas (Security of Supply and Network Codes) (Amendment) (EU Exit) Regulations 2019.
2 These Regulations come into force on exit day.

2 Interpretation
In these Regulations—
“the Balancing Code” means Commission Regulation (EU) No 312/2014 establishing a Network Code on Gas Balancing of Transmission Networks;
“the Interoperability Code” means Commission Regulation (EU) 2015/703 establishing a network code on interoperability and data exchange rules;
“the Capacity Allocation Mechanisms Code” means Commission Regulation (EU) 2017/459 establishing a network code on capacity allocation mechanisms in gas transmission systems;
“the Tariffs Code” means Commission Regulation (EU) 2017/460 establishing a network code on harmonised transmission tariff structures for gas;
“the Security of Gas Supply Regulation” means Regulation (EU) 2017/1938 concerning measures to safeguard the security of gas supply.
The Security of Supply Regulation is amended by S.I. xxx/2018.

Amendments to the Security of Gas Supply Regulation and the gas network codes
3 The Security of Gas Supply Regulation is amended as set out in Schedule 1.
4 The Balancing Code is amended as set out in Schedule 2.
5 The Interoperability Code is amended as set out in Schedule 3.
6 The Capacity Allocation Mechanisms Code is amended as set out in Schedule 4.
7 The Tariffs Code is amended as set out in Schedule 5.
Name Minister of State Department for Business, Energy and Industrial Strategy Date