PART 2 Amendments to retained direct EU legislation

CHAPTER 4 Amendment of the Security of Gas Supply Regulation

24 Amendment of Article 8
In Article 8 (establishment of preventive action plans and emergency plans)—
(a) in paragraph 5, omit the second sentence;
(b) after paragraph 5 insert—

“5A The Secretary of State may, by regulations, amend the templates set out in Annexes VI and VII in order to reflect the experience gained in the application of this Regulation and to reduce administrative burdens.”

.