3 Wards of the district of Herefordshire and number of councillors
1 The existing wards of the district of Herefordshire are abolished.
2 The district of Herefordshire is divided into 53 district wards, each listed by name in Schedule 1.
3 Each district ward comprises the area designated on the map by reference to the name of the district ward.
4 One councillor is to be elected for each district ward.
5 Where a boundary is shown on the map as running along a road, railway line, footway, watercourse or similar geographical feature, it is to be treated as running along the centre line of the feature.