SCHEDULE 2 Consequential amendments of the 1986 Act
3 In section 76 (summary financial statement for members and depositors)—
(a) in subsection (5), for “auditors’ opinion” substitute “auditor’s opinion”;
(b) in subsection (8A)(b), for “auditors’ report” substitute “auditor’s report” in both places where it occurs;
(c) in subsection (9), for “auditors’ report” substitute “auditor’s report” in both places where it occurs.
Section 76, subsections (8) and (8A) were substituted for subsection (8), as originally enacted, by S.I. 2001/2617.