Part VIII

Miscellaneous

Miscellaneous

Repeals
65
The enactments mentioned in Schedule 7 to this Measure are hereby repealed to the extent specified in the second column of that Schedule.
S. 65 in force at 1.2.2008 for specified purposes by 2007 No. 3, Instrument made by Archbishops
S. 65 in force at 1.5.2008 for specified purposes by 2008 No. 1, Instrument made by Archbishops
S. 65 in force at 11.6.2008 for specified purposes by 2007 No. 3, Instrument made by Archbishops
S. 65 in force at 1.9.2008 for specified purposes by 2008 No. 1, Instrument made by Archbishops
S. 65 in force at 1.1.2011 in so far as not already in force by 2010 No. 4, art. 2(c)