Part I

General principle

General duty
1
It shall be the duty of any person or body carrying out functions under this Measure ... to have due regard to the furtherance of the mission of the Church of England.
S. 1 in force at 1.1.2008 by 2007 No. 3, Instrument made by Archbishops
Words in s. 1 repealed (1.7.2012) by Mission and Pastoral Measure 2011 (No. 3), s. 112(3), Sch. 9 (with ss. 100, 105(4), 107, 108(6), Schs. 8); 2012 No. 1, art. 2