Amendment of the 2019 Regulations
2
1
The 2019 Regulations are amended in accordance with paragraphs (2) to (4).
2
In the schedule (fees), for Table 1 substitute—
Table 1
Subject matter of application | Fee payable
1. Construction, or construction and operation, of a generating station which is not EIA development and has a capacity— |
1. not exceeding 10 megawatts | £7,800
1. exceeding 10 megawatts but not exceeding 50 megawatts | £30,000
1. exceeding 50 megawatts but not exceeding 100 megawatts | £84,000
1. exceeding 100 megawatts but not exceeding 300 megawatts | £120,000
1. exceeding 300 megawatts but not exceeding 500 megawatts | £180,000
1. exceeding 500 megawatts but not exceeding 750 megawatts | £216,000
1. exceeding 750 megawatts but not exceeding 1 gigawatt | £264,000
1. exceeding 1 gigawatt | £264,000 + £15,000 for each additional 500 megawatts above 1 gigawatt
2. Extension, or extension and operation, of a generating station which is not EIA development, resulting in increase in capacity— |
1. not exceeding 10 megawatts | £7,800
1. exceeding 10 megawatts but not exceeding 50 megawatts | £30,000
1. exceeding 50 megawatts but not exceeding 100 megawatts | £84,000
1. exceeding 100 megawatts but not exceeding 300 megawatts | £120,000
1. exceeding 300 megawatts but not exceeding 500 megawatts | £180,000
1. exceeding 500 megawatts but not exceeding 750 megawatts | £216,000
1. exceeding 750 megawatts but not exceeding 1 gigawatt | £264,000
1. exceeding 1 gigawatt | £264,000 + £15,000 for each additional 500 megawatts above 1 gigawatt
3. Construction, or construction and operation, of a generating station which is EIA development and has a capacity— |
1. not exceeding 10 megawatts | £8,400
1. exceeding 10 megawatts but not exceeding 50 megawatts | £42,000
1. exceeding 50 megawatts but not exceeding 100 megawatts | £150,000
1. exceeding 100 megawatts but not exceeding 300 megawatts | £216,000
1. exceeding 300 megawatts but not exceeding 500 megawatts | £336,000
1. exceeding 500 megawatts but not exceeding 750 megawatts | £437,000
1. exceeding 750 megawatts but not exceeding 1 gigawatt | £548,000
1. exceeding 1 gigawatt | £548,000 + £30,000 for each additional 500 megawatts above 1 gigawatt
4. Extension, or extension and operation, of a generating station which is EIA development, resulting in an increase in capacity— |
1. not exceeding 10 megawatts | £8,400
1. exceeding 10 megawatts but not exceeding 50 megawatts | £42,000
1. exceeding 50 megawatts but not exceeding 100 megawatts | £150,000
1. exceeding 100 megawatts but not exceeding 300 megawatts | £216,000
1. exceeding 300 megawatts but not exceeding 500 megawatts | £336,000
1. exceeding 500 megawatts but not exceeding 750 megawatts | £437,000
1. exceeding 750 megawatts but not exceeding 1 gigawatt | £548,000
1. exceeding 1 gigawatt | £548,000 + £30,000 for each additional 500 megawatts above 1 gigawatt
5. Any other extension of a generating station which does not result in an increase in capacity, where the capacity of the generating station does— |
1. not exceed 10 megawatts | £7,800
1. exceed 10 megawatts | £30,000
6. Operation only or change to manner of operation of a generating station, which does not result in an increase in capacity, where the capacity of the generating station does— |
1. not exceed 10 megawatts | £7,800
1. exceed 10 megawatts | £30,000
3
In the schedule (fees), for Table 2 substitute—
Table 2
Subject matter of application | Fee payable
1. Overhead line which is not EIA development with a total distance— |
1. not exceeding 500 metres | £430
1. exceeding 500 metres but not exceeding 15 kilometres | £720 per kilometre, up to a maximum of £4,800
1. exceeding 15 kilometres | £10,800 + £720 per kilometre, up to a maximum of £180,000
2. Overhead line which is EIA development with a total distance— |
1. not exceeding 1 kilometre | £1,800
1. exceeding 1 kilometre | £1,800 per kilometre, up to a maximum of £360,000
4
In the schedule (fees), for Table 3 substitute—
Table 3
Variation application | Fee payable
1. A variation application which is not for EIA development and which, if granted, would increase the capacity of the generating station such that the increased capacity would— |
1. not exceed 10 megawatts | £5,850
1. exceed 10 megawatts but not exceed 50 megawatts | £22,500
1. exceed 50 megawatts but not exceed 100 megawatts | £63,000
1. exceed 100 megawatts but not exceed 300 megawatts | £90,000
1. exceed 300 megawatts but not exceed 500 megawatts | £135,000
1. exceed 500 megawatts but not exceed 750 megawatts | £164,400
1. exceed 750 megawatts but not exceed 1 gigawatt | £200,500
1. exceed 1 gigawatt | £200,500 + £15,000 for each additional 500 megawatts above 1 gigawatt
2. A variation application which is for EIA development and which, if granted, would increase the capacity of the generating station such that the increased capacity would— |
1. not exceed 10 megawatts | £6,300
1. exceed 10 megawatts but not exceed 50 megawatts | £31,500
1. exceed 50 megawatts but not exceed 100 megawatts | £112,500
1. exceed 100 megawatts but not exceed 300 megawatts | £162,000
1. exceed 300 megawatts but not exceed 500 megawatts | £252,000
1. exceed 500 megawatts but not exceed 750 megawatts | £310,000
1. exceed 750 megawatts but not exceed 1 gigawatt | £367,000
1. exceed 1 gigawatt | £367,000 + £30,000 for each additional 500 megawatts above 1 gigawatt
3. A variation application which is not for EIA development and which, if granted, would not increase the capacity of the generating station, where the generating station has a capacity— |
1. not exceeding 10 megawatts | £5,740
1. exceeding 10 megawatts | £22,500
4. A variation application which is for EIA development and which, if granted, would not increase the capacity of the generating station, where the generating station has a capacity— |
1. not exceeding 10 megawatts | £6,300
1. exceeding 10 megawatts but not exceeding 50 megawatts | £31,500
1. exceeding 50 megawatts but not exceeding 100 megawatts | £112,500
1. exceeding 100 megawatts but not exceeding 300 megawatts | £162,000
1. exceeding 300 megawatts but not exceeding 500 megawatts | £252,000
1. exceeding 500 megawatts but not exceeding 750 megawatts | £310,000
1. exceeding 750 megawatts but not exceeding 1 gigawatt | £367,000
1. exceeding 1 gigawatt | £367,000 + £30,000 for each additional 500 megawatts above 1 gigawatt