SCHEDULE

TRANSITIONAL PROVISIONS

Approved laboratories – record keeping and disclosure
6
Article 24 applies to any operator of an approved laboratory (within the meaning of the 2013 Order) in relation to a record of any test carried out under that Order before the coming into force day.
Sch. para. 6 in force at 1.12.2019, see art. 1(1)