PART 2

BVD Screening

Approval of laboratories
7
1
The Scottish Ministers may approve, subject to any conditions that the Scottish Ministers consider necessary, any laboratory that they consider to be suitable for the purpose of testing samples submitted under this Part.
2
For the purpose of deciding whether to grant an approval under this article, the Scottish Ministers may require the operator of a laboratory to arrange or permit such inspections and quality assurance testing as the Scottish Ministers consider necessary.
3
The operator of an approved laboratory must comply with any condition of the approval.
Art. 7 in force at 1.12.2019, see art. 1(1)