PART 2

BVD Screening

Testing for exposure to BVDV
20
1
This article applies where—
a
the keeper of a breeding herd has taken (or arranged to have taken) samples described in article 9(3)(b), (4) or (5),
b
the keeper has arranged for the testing of the samples by an approved laboratory in accordance with article 18, and
c
the samples have been submitted to an approved laboratory.
2
Where this article applies, the operator of the approved laboratory must—
a
test each of the samples for evidence of exposure to BVDV, and
b
determine whether or not any of the samples show evidence of exposure to BVDV.