PART 2

BVD Screening

Sampling restricted to veterinary surgeons
17
1
A keeper may not take (or arrange to have taken) a sample referred to in paragraph (2) unless the sample is taken by, or under the supervision of, a veterinary surgeon.
2
The samples referred to in this paragraph are—
a
a sample of blood from any bovine animal, or
b
any sample from a bovine animal which has an individual BVD status of positive.
Art. 17 in force at 1.12.2019, see art. 1(1)