PART 2

BVD Screening

Follow-on sampling of long term not negative herds
13
1
This article applies to a breeding herd on the date that article 12 ceases to apply to the herd in accordance with article 12(2)(a).
2
This article ceases to apply on the date falling 12 months after this article first applies.
3
Where this article applies, the keeper must take—
a
an ear tag sample of tissue taken in accordance with article 14, or
b
a sample of blood,
from each calf born in the herd.