PART 3

RISK ASSESSMENT OF WATER SUPPLIES

Duties in relation to use of disused system
13
1
If part of a private water supply system has been used to provide a supply of water in pipes but has not been used for that purpose in the preceding 12 months (“the disused part”), no person may use the disused part to provide of a supply of water to premises (“the intended use”) unless—
a
the disused part is recorded in the appropriate register;
b
a risk assessment has been carried out in relation to the supply system by the enforcing authority for the area in which the premises is situated;
c
the risk assessment—
i
takes account of the intended use of the disused part and was carried out within the period of 8 weeks preceding the intended use of the disused part; or
ii
has been reviewed and updated to take account of the intended use of disused part within the period of 8 weeks preceding the intended use of the disused part; and
d
the enforcing authority has confirmed, by notice to the person, that it is satisfied that—
i
the risk assessment does not identify any risk that the intended use of the disused part could constitute a potential danger to human health; and
ii
the disused part may be used for the intended use.
2
If the risk assessment does not take account of the intended use of the disused part, a person who wishes to use the disused part (“the person”) may request that the enforcing authority review and update the risk assessment ... to take account of the intended use of the disused part.
3
On receipt of a request under paragraph (2) and the payment of any fee charged under these Regulations, the enforcing authority must within a further period of 8 weeks beginning with the day the request was received or the day the payment was made (whichever is the later)—
a
review and, where necessary, update the risk assessment to take account of the intended use of the disused part; and
b
confirm, by notice to the person, whether it is satisfied as to the matters in paragraph (1)(d)(i) and (ii).
Words in reg. 13(2) omitted (26.10.2017) by virtue of The Public and Private Water Supplies (Miscellaneous Amendments) (Scotland) Regulations 2017 (S.S.I. 2017/321), regs. 1, 4(3)
Reg. 13 in force at 27.10.2017, see reg. 1(1)