PART 6

REPORTS

General provisions about regulations under these Regulations
60ZA
1
Regulations under these Regulations are to be made by Scottish statutory instrument subject to the negative procedure.
2
Regulations under these Regulations may make supplementary, incidental, transitional or saving provision.

Reporting requirements
60
Contracting entities must send to the Scottish Ministers a report containing such information as the Scottish Ministers may from time to time request in respect of concession contracts within the scope of these Regulations for the purpose of enabling the Scottish Ministers to provide the European Commission with information.

Review of these Regulations
61
1
The Scottish Ministers must from time to time—
a
carry out a review of these Regulations;
b
set out the conclusions of the review in a report; and
c
publish the report.
2
In carrying out the review, the Scottish Ministers must, so far as is reasonable, have regard to how the Concession Contracts Directive is implemented in other member States.
3
The report must in particular—
a
set out the objectives intended to be achieved by the regulatory system established by these Regulations;
b
assess the extent to which those objectives are achieved; and
c
assess whether those objectives remain appropriate and, if so, the extent to which they could be achieved with a system that imposes less regulation.
4
The first report under this regulation must be published before 18th April 2021.
5
Reports under this regulation are afterwards to be published at intervals not exceeding 5 years.
Reg. 61 in force at 18.4.2016, see reg. 1(2)
Reg. 60 in force at 18.4.2016, see reg. 1(2)
Reg. 60ZA inserted (31.12.2020) by The Public Procurement etc. (EU Exit) (Scotland) (Amendment) Regulations 2020 (S.S.I. 2020/468), regs. 1(2), 8(31) (with sch. paras. 1-5)