2015 No. 90

Flood Risk Management

Water Supply

The Reservoirs (Scotland) Regulations 2015 (revoked)
Made
26th February 2015
Laid before the Scottish Parliament
2nd March 2015
Coming into force
1st April 2015
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 1

INTRODUCTORY

Citation, commencement and interpretation
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 2

CONTROLLED RESERVOIRS

Lochs and other areas to be considered artificial or partly artificial
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Calculation of volume of water that a structure or area is capable of holding
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Calculation of volume of water that a structure or area is capable of releasing
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Meaning of “natural level” and “surrounding land”
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Structures or areas which are not controlled reservoirs
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 3

REGISTRATION

Controlled reservoirs register: additional information
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Information that a reservoir manager must register with SEPA
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Time by which changes to information must be registered
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Registration fees: general
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Registration fees: determination and charging
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Annual subsistence fee: general
15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Annual subsistence fee: determination and charging
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transfer fees: general
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transfer fees: determination and charging
18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Charging schemes
19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 3A

RISK DESIGNATION

Applications for review of risk designations under section 23 of the Act
19A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appeals to the Scottish Ministers following a review by SEPA of risk designation
19B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 4

PANELS OF RESERVOIR ENGINEERS

Applications for appointment: general
20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Applications for appointment: eligible persons
21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Fees in connection with applications for membership of panels
22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Applications for review of decisions to appoint or remove civil engineers from panels etc.
23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 1

CONTROLLED RESERVOIRS: INFORMATION TO BE REGISTERED
Regulation 11(a)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 2

PANEL APPLICATIONS: GENERAL
Regulation 20(2)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 3

PANEL APPLICATIONS: ELIGIBLE PERSONS
Regulation 21(1)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE 4

REVIEW APPLICATIONS: INFORMATION
Regulation 23(2)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.4.2016) by The Reservoirs (Scotland) Regulations 2016 (S.S.I. 2016/43), reg. 1, sch. 19