Scottish Statutory Instruments
2015 No. 272 (C. 36)
Housing
The Housing (Scotland) Act 2014 (Commencement No. 3 and Transitional Provision) Order 2015
Made 24th June 2015
Laid before the Scottish Parliament 26th June 2015
Coming into force 13th July 2015

The Scottish Ministers make the following Order in exercise of the powers conferred by section 104(3) and (5) of the Housing (Scotland) Act 2014 and all other powers enabling them to do so.
2014 asp 14.

Citation, commencement and interpretation
1. (1) This Order may be cited as the Housing (Scotland) Act 2014 (Commencement No. 3 and Transitional Provision) Order 2015 and comes into force on 13th July 2015.
(2) In this Order, “the Act” means the Housing (Scotland) Act 2014 and “the 2006 Act” means the Housing (Scotland) Act 2006.
2006 asp 1.

Appointed days
2. The day appointed for the coming into force of the provisions of the Act specified in column 1 of the Schedule (the subject-matter of which is described in column 2 of the Schedule) is specified in column 3 of the Schedule.

Transitional provision
3. (1) Subject to paragraph (2), where a tenancy exists on 1st December 2015—
(a) section 19A(1) and (3)(b) of the 2006 Act (duty to ensure regular electrical safety inspections and to provide tenant with a copy of the record of any inspection) does not apply to that tenancy until 1st December 2016;
Sections 19A and 19B of the 2006 Act are inserted by section 23 of the Act.
(b) an electrical safety inspection as required by section 19A(1) must be undertaken no later than 1st December 2016, if the tenancy remains in existence on that date;
(c) section 19A(2)(a) and (3)(a) (requirement to ensure inspection before the start of the tenancy and provide the tenant with a copy of the record of the most recent inspection) does not apply; and
(d) section 19A(3)(b) (duty to provide the tenant with a copy of the record of any inspection carried out during the tenancy) is complied with by providing the tenant with a copy of the most recent inspection.
(2) Where an electrical safety inspection that complies with the requirements of paragraph (3) has been undertaken in the period beginning with 1st January 2012 and ending with 30th November 2015 and the tenant has been provided with a copy of the record of that inspection, any duty under section 19A(1) of the 2006 Act is complied with for a period of 5 years from the date of that inspection.
(3) The requirements are those set out in sections 19A(1) and 19B of the 2006 Act, without the requirement for inspection of electrical appliances.
M J BURGESS
Authorised to sign by the Scottish Ministers
St Andrew’s House,
Edinburgh
24th June 2015
SCHEDULE
Column 1	Column 2	Column 3
Provisions of the Act	Subject-matter	Appointed Day
Section 89	Maintenance plans	13th July 2015
Section 97 (insofar as not already in force)	Scottish Housing Regulator: transfer of assets following inquiries	31st August 2015
Section 22	Carbon monoxide alarms	1st December 2015
Section 23 (insofar as not already in force)	Electrical safety inspections	1st December 2015
. . .	. . .	. . .
Section 26 (insofar as not already in force)	Procedure for third party applications	1st December 2015
Section 27	Appeals in relation to third party applications	1st December 2015
Article 2
Words in sch. omitted (30.11.2015) by virtue of The Housing (Scotland) Act 2014 (Commencement No. 4 and Amendment) Order 2015 (S.S.I. 2015/349), arts. 1, 2(2)

EXPLANATORY NOTE
(This note is not part of the Order)
This Order brings into force various provisions of the Housing (Scotland) Act 2014 (“the 2014 Act”).
Article 2 and the Schedule to the Order appoint 13th July 2015 for the coming into force of section 89 and 31st August 2015 for the coming into force of section 97 (insofar as not already in force).
Article 2 and the Schedule also appoint 1st December 2015 for the coming into force of sections 22, 23 (insofar as not already in force), 25, 26 (insofar as not already in force) and 27.
Article 3 modifies the duty to undertake an electrical safety inspection provided by section 19A(1) of the Housing (Scotland) Act 2006 (introduced by section 23 of the 2014 Act) in relation to a tenancy which exists on 1st December 2015. Article 3 requires the landlord to ensure that an inspection is carried out by 1st December 2016 unless the tenancy ends before that date. The inspection duty is also met if an inspection has been carried out in the period beginning on 1st January 2012 and ending on 30th November 2015 and that inspection complies with the inspection requirements, ignoring any duty to inspect electrical appliances. Any inspection carried out after 30th November 2015 will, however, have to include inspection of electrical appliances.

NOTE AS TO EARLIER COMMENCEMENT ORDERS
(This note is not part of the Order)
Sections 100, 101, 102, 104 and 105 of the 2014 Act came into force on the day the Bill for the 2014 Act received Royal Assent: 1st August 2014. The provisions of the 2014 Act commenced by an earlier commencement order are detailed in the table below.
Provision of the 2014 Act	Date of Commencement	S.S.I.No.
Section 1(1)	1st August 2016	S.S.I. 2014/264
Section 1(2)	20th November 2014	S.S.I. 2014/264
Section 1(3) (partially)	20th November 2014	S.S.I. 2014/264
Section 1(3) (insofar as not already in force)	1st July 2017	S.S.I. 2014/264
Section 2	20th November 2014	S.S.I. 2014/264
Section 4(2) (partially)	20th November 2014	S.S.I. 2014/264
Section 6(2) (partially)	20th November 2014	S.S.I. 2014/264
Section 7(1)(b)	20th November 2014	S.S.I. 2014/264
Section 14(1)	20th November 2014	S.S.I. 2014/264
Section 20, 23(1), 24 and 26(7)	20th November 2014	S.S.I. 2014/264
Section 28	20th November 2014	S.S.I. 2014/264
Section 46 and 61	20th November 2014	S.S.I. 2014/264
Section 62 (partially)	20th November 2014	S.S.I. 2014/264
Sections 64 and 65 (partially)	20th November 2014	S.S.I. 2014/264
Section 70	20th November 2014	S.S.I. 2014/264
Section 77 (partially)	20th November 2014	S.S.I. 2014/264
Section 82	20th November 2014	S.S.I. 2014/264
Section 85(3) and (4)	20th November 2014	S.S.I. 2014/264
Section 85 (remainder)	1st April 2015	S.S.I. 2015/122
Section 86(1) (partially)	13th November 2014	S.S.I. 2014/264
Section 86(2) (partially)	13th November 2014	S.S.I. 2014/264
Section 86 (remainder)	16th December 2014	S.S.I. 2014/264
Sections 87 and 88	1st April 2015	S.S.I. 2015/122
Sections 90 to 92	1st April 2015	S.S.I. 2015/122
Section 94 to 96	20th November 2014	S.S.I. 2014/264
Section 97 (partially)	20th November 2014	S.S.I. 2014/264
Section 98	20th November 2014	S.S.I. 2014/264
Section 103 (partially)	20th November 2014	S.S.I. 2014/264
Section 103 (partially)	1st August 2016	S.S.I. 2014/264
Schedule 2 (partially)	1st August 2016	S.S.I. 2014/264

Art. 1 in force at 13.7.2015, see art. 1(1)
Art. 2 in force at 13.7.2015, see art. 1(1)
Art. 3 in force at 13.7.2015, see art. 1(1)
Sch. in force at 13.7.2015, see art. 1(1)