PART 5 Retirement benefits for teachers

CHAPTER 6 Ill health retirement

SECTION 2 Ill-health pension

106 Entitlement day for ill-health pension
1 The entitlement day for an ill-health pension is the latest of the following—
(a) the day specified in the medical report as the day on which a person (P) first met the incapacity condition or, if applicable, the total incapacity condition;
(b) the day which occurs 6 months before the date of a medical report following consideration of which the scheme manager is satisfied that P meets the incapacity condition or, if applicable, the total incapacity condition;
(c) the day after P leaves all eligible employment.
2 The entitlement day must not be before the date of any medical report following consideration of which the scheme manager was not satisfied that P met the incapacity condition or, if applicable, the total incapacity condition.