PART 2

BVD screening
CHAPTER 1

General provisions

Approval of laboratories
6
1
The Scottish Ministers may approve any laboratory that they consider to be suitable for the purpose of testing samples submitted under this Part.
2
For the purpose of deciding whether to grant an approval under this article, the Scottish Ministers may require the operator of a laboratory to arrange or permit such inspections and quality assurance testing as Ministers consider necessary.
3
The operator of an approved laboratory must comply with any condition of the approval.
Art. 6 in force at 9.2.2013, see art. 1(1)