PART 3

Reporting of tests

Reporting of tests for presence of BVDV
20
1
This article applies where, other than under Part 2, a laboratory (including an approved laboratory) tests for the presence of BVDV a sample (of any description) taken from a bovine animal.
2
The operator of the laboratory must by notice inform the Scottish Ministers, within 40 days of testing the sample, of—
a
a description of the sample;
b
the date the sample was tested;
c
the result of the test; and
d
in so far as known by the operator—
i
any ear tag numbers from ear tags applied to the animal under the 2007 Regulations;
ii
the keeper’s name and address;
iii
the CPH number for the holding on which the animal was kept at the time the sample was taken; and
iv
the date the sample was taken.
Art. 20 in force at 9.2.2013, see art. 1(1)