PART 2

BVD screening
CHAPTER 3

Testing requirements

Approved laboratories - record keeping and disclosure
19
1
The operator of an approved laboratory must maintain a record of any test carried out under this Part for 3 years from the date of such a test.
2
The operator of the approved laboratory must, if requested by notice by the Scottish Ministers to do so, provide the Scottish Ministers with such records.
Art. 19 in force at 9.2.2013, see art. 1(1)