SCHEDULE
Regulation 2(4)
SCHEDULE 2

VOUCHER VALUES – REPAIR
Regulation 19(2) and (3)
Column 1 | Column 2
Nature of Repair to Appliance | Letter Codes – Values
| A £ | B £ | C £ | D £ | E £ | F £ | G £ | H £ | I £
Repair or replacement of one lens | 11.55 | 21.20 | 34.30 | 86.25 | 25.10 | 33.80 | 45.90 | 95.55 | 88.50
Repair or replacement of two lenses | 23.10 | 42.40 | 68.60 | 172.50 | 50.20 | 67.60 | 91.80 | 191.10 | 177.00
Repair or replacement of– | | | | | | | | |
the front of a frame | 11.90 | 11.90 | 11.90 | 11.90 | 11.90 | 11.90 | 11.90 | 11.90 | 11.90
a side of a frame | 7.05 | 7.05 | 7.05 | 7.05 | 7.05 | 7.05 | 7.05 | 7.05 | 7.05
the whole frame | 14.00 | 14.00 | 14.00 | 14.00 | 14.00 | 14.00 | 14.00 | 14.00 | 14.00