Annual targets for the period 2010-2022
2
The annual targets expressed in tonnes of carbon dioxide equivalent for the period 2010-2022 are as follows:—
a
the annual target for 2010 is 53,652,000;
b
the annual target for 2011 is 53,404,000;
c
the annual target for 2012 is 53,226,000;
d
the annual target for 2013 is 47,976,000;
e
the annual target for 2014 is 46,958,000;
f
the annual target for 2015 is 45,928,000;
g
the annual target for 2016 is 44,933,000;
h
the annual target for 2017 is 43,946,000;
i
the annual target for 2018 is 42,966,000;
j
the annual target for 2019 is 41,976,000;
k
the annual target for 2020 is 40,717,000;
l
the annual target for 2021 is 39,495,000; and
m
the annual target for 2022 is 38,310,000.
A “tonne of carbon dioxide equivalent” is defined in section 18(2) of the Climate Change (Scotland) Act 2009.