(This note is not part of the Order)
This Order provides for the exemption from rating of cables used for certain purposes and associated apparatus and works, where such cables lie seaward of the low water mark of ordinary spring tides but only where one end of the cable is in Scotland and the other end is outside Great Britain.
Those purposes are (a) the processing or transmission of electronic communications services, or (b) the transmission or distribution of electricity.