Interpretation
2
1
In this Order, except where the context otherwise requires–
- “the Authority” means Peterhead Port Authority;
- “deposited plans” and “deposited sections” mean respectively the plans and sections which have been deposited in connection with this Order, two copies of which have been deposited at the Scottish Executive, Transport Directorate, APF & C Division, Victoria Quay, Edinburgh EH6 6QQ and one copy of which has been deposited at the offices of the Authority, Harbour Office, West Pier, Peterhead, Aberdeenshire AB42 1DW;
- “level of high water” means the level of mean high water springs;
- “limits of deviation” means the limits of deviation shown on the deposited plans;
- “port” means the Port of Peterhead;
- “tidal work” means so much of any work authorised by this Order as is on, under or over tidal waters or tidal lands below the level of high water;
- “undertaking” means the port undertaking for the time being of the Authority; and
- “works” means the works authorised by this Order, or as the case may require, any part thereof and includes any work constructed pursuant to article 3 (power to construct works) or article 5 (subsidiary works).
2
All areas, directions, distances, lengths, widths and heights as stated in any description of works, powers or lands other than article 4 (power to deviate) shall be construed as if the words “or thereabouts” were inserted after each such area, direction, distance, length, width and height and any reference in a description of works to a point shall be a reference to that point on the deposited plans.
3
Any reference in this Order to a work identified by the number of such work shall be construed as a reference to the work of that number authorised by this Order.