Citation, commencement and extent
1
1
These Regulations may be cited as the Energy Performance of Buildings (Scotland) Regulations 2008 and come into force on 4th January 2009.
2
These Regulations extend to Scotland only.

Interpretation
2
1
In these Regulations–
- “approved organisation” has the meaning given in regulation 8(1);
- “asset rating” means a numerical indicator of the estimated amount of–
  1. energy consumed; and
  2. carbon dioxide emitted,
to meet the different needs associated with a standardised use of the building or building unit, such estimate being made in accordance with a method of calculation approved under regulation 7(a);
- “authorised recipient” means a person or body specified in Part 1 of Schedule 1;
...
- “dwelling” has the same meaning as regulation 2 of the Building (Scotland) Regulations 2004 ;
- “electronic communication” has the meaning given in section 15(1) of the Electronic Communications Act 2000;
- “energy performance certificate” means a certificate which complies with regulation 6;
- “
energy performance data
” means information needed to produce an energy performance certificate or a recommendations report
and for the purposes of regulations 11 to 14 includes the report reference number relating to that energy performance certificate
;
- “energy performance indicator” means an indication of the energy efficiency or performance rating of a building or building unit calculated using the methodology approved in accordance with regulation 7 and expressed on a scale of A to G (with G representing the lowest rating);
- “enforcement authority” has the meaning given in regulation 15(1);
- “excluded building” means—
  1. a building owned, occupied or used from time to time by any of the naval, military or air forces of the Crown, the Security Service, the Secret Intelligence Service. the Government Communications Headquarters or the Royal Family; or
  2. used for the purpose of a prison or a young offenders institution (within the meaning of section 19(1)(b) of the Prisons (Scotland) Act 1989);
- “
Framework Regulations
” means the Green Deal Framework (Disclosure, Acknowledgement, Redress
etc.
) Regulations 2012;
- “green deal information” means the information relating to a green deal plan specified in Schedule 2;
- “green deal plan” has the same meaning as in section 1 of the Energy Act 2011;
- “green deal property” means a property in respect of which there is a green deal plan and payments are still to be made under that green deal plan;
- “green deal provider” means a person who is authorised by the Secretary of State in accordance with Part 2 of the Framework Regulations to act as a green deal provider;
- “green deal relevant person” means—
  1. a green deal provider; or
  2. a person who is authorised as a green deal assessor certification body in accordance with Part 2 of the Framework Regulations;
- “house” has the same meaning as in regulation 2 of the Building (Scotland) Regulations 2004;
- “local authority” means a council constituted under section 2 of the Local Government etc (Scotland) Act 1994 ;
- “keeper” means the Scottish Ministers or a person appointed by the Scottish Ministers to keep a register on their behalf in accordance with regulation 10;
- “owner”, other than in regulation 9, means–
  1. in relation to a building or building unit which is to be sold, the seller; and
  2. in relation to a building or building unit which is to be let, the prospective landlord;
- “payment period” has the meaning given in regulation 2(1) of the Framework Regulations;
- “prospective buyer” and “prospective tenant” have the meaning given in regulation 3;
- “
recommendations report
” has the meaning given in regulation 6A;
- “reference value” means such current legal standard or benchmark which makes it possible to compare and assess the energy performance of the building or building unit; and
- “report reference number” means the unique reference under which the energy performance data relating to an energy performance certificate for a building or building unit is entered onto the register;
...
2
Unless otherwise defined in these Regulations, terms used in these Regulations have the same meaning as in Directive 2010/31/EU of the European Parliament and of the Council on the energy performance of buildings .

Meaning of prospective buyer or prospective tenant
3
A person becomes a prospective buyer or prospective tenant in relation to a building or building unit on the earliest of the dates when that person—
a
requests any information about the building or building unit from the owner for the purpose of deciding whether to buy or lease the building or building unit;
b
makes a request to view the building for the purpose of deciding whether to buy or lease the building or building unit; or
c
makes an offer, whether oral or written, to buy or lease the building or building unit.

Application of Regulations
4
These Regulations do not apply to—
a
temporary buildings with a planned time of use of two years or less, workshops and non-residential agricultural buildings with low energy demand; and
b
stand-alone buildings with a total useful floor area of less than 50m2 which are not dwellings.

Energy performance certificates on sale or rent
5
1
Where a building or building unit is to be sold or let the owner must make a copy of a valid energy performance certificate for the building or building unit and of the related recommendations report available for inspection free of charge to a prospective buyer or a prospective tenant.
2
Where a building or building unit is sold or let the owner must provide a copy of a valid energy performance certificate and of the related recommendations report free of charge to the buyer or tenant.
3
The energy performance certificate to be made available for inspection under paragraph (1) or provided under paragraph (2) is the most recent valid certificate obtained in respect of the building or building unit.
4
Any reference in this regulation to the letting of a building or building unit does not include the renewal of an existing lease with the same tenant.
5
This regulation does not apply at any time before the construction of a building or building unit has been completed.

Advertisement for sale or let of a building or building unit
5A
1
Subject to paragraph (2), where a building or building unit is offered for sale or let, the owner of the building or building unit must ensure that any advertisement in commercial media offering the building or building unit for sale or let, as the case may be, states the energy performance indicator for that building or building unit.
2
Where—
a
a building unit is offered for sale or let; and
b
the energy performance certificate for that building unit is based on certification in accordance with regulation 6(4),
the advertisement in commercial media may state the energy performance indicator included in that certificate.
3
In this regulation “
advertisement in commercial media
” means any of the following:—
a
an advertisement in a newspaper or a magazine;
b
an advertisement transmitted electronically, including by means of the internet; or
c
an advertisement by way of written particulars of a building or building unit.
4
In this regulation “
written particulars
” means—
a
in relation to a building or building unit to be sold, any written description of the property which includes at least two of the following—
i
a photograph of the building or building unit or any room in the building or building unit;
ii
a floor plan of the building or building unit;
iii
the size of the rooms in the building or building unit; or
iv
the measured area of the building or building unit; and
b
in relation to a building or building unit to be let, any written description of the property which includes at least two of the following—
i
a photograph of the building or building unit or any room in the building or building unit;
ii
a floor plan of the building or building unit;
iii
the size of the rooms in the building or building unit; or
iv
the proposed rent,
and reference to written particulars or a written description includes particulars or a description given or made available electronically.

Energy performance certificates
6
1
An energy performance certificate must–
a
express the asset rating of the building or building unit in a way approved by the Scottish Ministers under regulation 7(b);
b
include a reference value;
ba
include an energy performance indicator;
bb
include an indicator, expressed numerically, of primary energy use;
c
contain cost effective and technically feasible recommendations for improving the energy performance of the building or building unit including—
i
measures in connection with a major renovation of the building envelope or technical building systems; and
ii
measures for individual building elements independent of a major renovation of the building envelope or technical building systems;
ca
include a statement indicating that—
i
more detailed information on the cost effectiveness of the recommendations made in the energy performance certificate; and
ii
the steps to be taken to implement those recommendations,
are contained in the recommendations report;
d
include the following information–
i
the address of the building or building unit;
ii
where the certificate is issued by a qualified member of an approved organisation, the name of the approved organisation of which the person issuing the certificate is a member; and
iii
the date on which it was issued; and
e
be issued by a qualified member of an approved organisation for that category of building or building unit
or produced from data entered on a register following a request for disclosure of that certificate made by virtue of regulation 12
.
1A
Where the building or building unit to which the energy performance certificate relates is a green deal property the energy performance certificate must (in addition to the information specified in paragraph (1)(a) to (d)) contain a statement that green deal information relating to that building or building unit is contained in the recommendations report.
2
An energy performance certificate and the related recommendations report cease to be valid—
a
for the purposes of complying with the green deal disclosure obligations, on expiry of the period of one year from the date on which the document was issued or from the date on which it was produced from a register by virtue of regulation 12, as the case may be;
b
for all other purposes, on the expiry of a period of 10
years from the date on which the document was issued.
3
An energy performance certificate must not contain any information or data from which a living individual (other than the person issuing it or that person's employer) can be identified.
4
Certification for a building unit may be based—
a
on the assessment of another representative building unit with the same energy-relevant characteristics in the same building; or
b
on a common certification of the whole building in which the building unit is located.
5
Paragraph (4)(b) does not apply to a unit that is a dwelling.
6
Certification for a house may be based on the assessment of another representative house where—
a
the representative house is of similar design, size and actual energy performance quality; and
b
the member of the approved organisation issuing the energy performance certificate has confirmed in writing that this is the case.
7
In this regulation, “green deal disclosure obligations” means the obligations to provide an energy performance certificate and recommendations report by virtue of section 12 of the Energy Act 2011 and Part 7 of the Framework Regulations.

Recommendations report
6A
1
A recommendations report is a report which must include—
a
more detailed information on the cost effectiveness of the recommendations made in the energy performance certificate to which it relates; ...
b
the steps to be taken to implement those recommendations
; and
c
where the building or building unit to which the recommendation report relates is a green deal property, green deal information for every green deal plan in respect of that building or building unit
2
A recommendations report must not contain any information or data (except for the address of the building or building unit
or green deal information
) from which a living individual (other than the person issuing it or that person's employer) can be identified.
3
A recommendations report must not contain any information relating to a green deal plan for which the payment period has finished.

Assessment of energy performance
7
The Scottish Ministers must approve—
a
a methodology of calculation of the energy performance of buildings or building units, including methods for calculating asset ratings of buildings or building units, based on the general framework set out in Annex
1 to Directive 2010/31/
EU
of the European Parliament and of the Council; and
b
ways in which the energy performance of buildings or building units, as calculated in accordance with the methodology, must be expressed.

Approved organisations
8
1
An approved organisation is an organisation approved by the Scottish Ministers in accordance with this regulation as an organisation whose members may issue energy performance certificates.
2
The terms of approval of any organisation may be limited in relation to the categories of building or building unit for which its members may issue energy performance certificates.
3
Before approving an organisation the Scottish Ministers must be satisfied that the organisation will–
a
ensure that the preparation and issuing of energy performance certificates is carried out in a consistent, accurate and independent manner; and
b
ensure that members are fit and proper persons who are qualified by their education, training and experience to carry out the preparation and issuing of energy performance certificates.

Display of energy performance certificates
9
1
Where this paragraph applies, the owner of a building which is frequently visited by the public or, where the owner is not the occupier, the occupier must ensure that an energy performance certificate is displayed within the building in a prominent place clearly visible to visiting members of the public.
2
Paragraph (1) applies—
a
in the case of a building occupied by a public authority—
i
before 9th July 2015, where the floor area of the building is greater than 500 square metres; and
ii
on or after 9th July 2015, where the floor area of the building is greater than 250 square metres;
b
in the case of any other building where—
i
the floor area of the building is greater than 500 square metres; and
ii
an energy performance certificate has been issued in relation to that building.
3
For the purpose of this regulation—
- “
owner
” means a person who has right to the building whether or not that person has completed title, but if, in relation to the building more than one person comes within that description of owner, then “
owner
” means such person as has most recently acquired such right; and
- “
building which is frequently visited by the public
” means a building into which members of the public have an express or implied licence to enter and which is visited by members of the public on at least a weekly basis.

Registration of certificates
10
1
There must be one or more registers of energy performance data from which the following documents may be produced—
a
an energy performance certificate; and
b
a recommendations report.
2
Each register referred to in paragraph (1) shall be maintained by a keeper.
3
A register may be maintained for different purposes or for different classes of buildings or building units.
4
Where a member of an approved organisation issues any document referred to in paragraph (1)(a) or (b), that person must ensure that the energy performance data relating to that document is sent to the relevant register before the document is issued.
5
Any energy performance data entered onto a register—
a
must be registered under a unique reference; and
b
subject to paragraph (5A),
must not be altered once registered.
5A
Green deal information entered on the register may be altered where that information is updated or further updated by the green deal provider in accordance with the Framework Regulations.
6
Any energy performance data entered onto a register must be kept on the register for a period of at least 10 years beginning on the date on which it is entered onto the register.

Fees for entering data onto register
10A
The keeper of a register may charge the following fees for entering data onto the register—
a
for entering data from which an energy performance certificate and recommendations report which relate to a dwelling may be produced, a fee of
£2.60
; and
b
for entering data from which an energy performance certificate and recommendations report which relate to a building or building unit other than a dwelling may be produced, a fee of
£12.10
.

Disclosures generally
11
The keeper of a register may only disclose any—
a
energy performance data;
b
any document produced from that data; and
c
any information derived from that data,
if authorised by
or required to do so by regulations 12 to 14A
.

Disclosure of documents
12
1
The keeper of a register may disclose—
a
the energy performance certificate; and
b
the recommendations report,
for a building or building unit to any person if the conditions in paragraph (2) are met.
2
The conditions are that—
a
a request is made by means of a website operated by the keeper; and
b
the request includes—
i
where the building or building unit to which the request relates is a green deal property, the report reference number for the energy performance data relating to the document; or
ii
where the building or building unit to which the request relates is not a green deal property—
aa
the full address (excluding the postcode) of the building or building unit;
bb
the full postcode of the building or building unit; or
cc
the report reference number for the energy performance data relating to the document.

Disclosure of data relating to a particular building or building unit
12A
1
The keeper of a register may disclose energy performance data relating to a particular building or building unit to an authorised recipient if all of the conditions in paragraph (2) are met.
2
The conditions are that—
a
a request for disclosure of the data to the authorised recipient is made—
i
by means of a website operated by the keeper; or
ii
by electronic communication sent to an address or location specified by the keeper for the purpose of the receipt of such requests;
b
the request includes—
i
the full address (excluding the postcode) of the particular building or building unit to which the data relates;
ii
the full postcode of that building or building unit; or
iii
the report reference number for the energy performance data relating to the building or building unit;
ba
the data does not include any—
i
green deal information; or
ii
information revealing the report reference number relating to an energy performance certificate for a green deal property;
c
the disclosure is made subject to—
i
the condition that the data is to be used by the recipient solely for one or more of the purposes described in Part
2 of Schedule 1;
...
ii. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
d
the particular building or building unit to which the data relates is not an excluded building.
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4
The keeper may refuse to disclose information under paragraph (1) where the person who requests the disclosure has previously failed to comply with a condition of the kind referred to in paragraph (2)(c).
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Disclosure of bulk access data
13
1
The keeper of a register may disclose energy performance data to an authorised recipient if all of the conditions in paragraph (2) are met.
2
The conditions are that—
a
the authorised recipient has made a request for one or more specific descriptions of data to the keeper;
b
the request is made—
i
by means of a website operated by the keeper; or
ii
by electronic communication sent to an address or location specified by the keeper for the purpose of the receipt of such requests;
c
the data does not include any information revealing the location of an excluded building (or any information from which the location of such a building can be deduced);
ca
the data does not include any—
i
green deal information; or
ii
information revealing the report reference number relating to an energy performance certificate for a green deal property;
d
the disclosure is made subject to—
i
the condition that the data is to be used by the recipient solely for one or more of the purposes described in Part
2 of Schedule 1; and
ii. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
e
the data does not relate only to a particular building or building unit.
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4
The keeper may refuse to disclose information under paragraph (1) where the person who requests the disclosure has previously failed to comply with a condition of the kind referred to in paragraph (2)(d).

Disclosure of data
14
1
The keeper of a register must when requested to do so disclose energy performance data—
a
to an enforcement authority for the purposes of their duty to enforce these Regulations; or
b
where the disclosure is required by or under any enactment, by any rule of law or by the order of a court.
2
The keeper may disclose energy performance data to the Scottish Ministers ....

Disclosure of green deal information
14A
1
The keeper of a register must when requested to do so disclose green deal information—
a
to an enforcement authority for the purposes of their duty to enforce these Regulations; or
b
to the Secretary of State, a person acting on behalf of the Secretary of State or the Green Deal Ombudsman for the purpose of enabling that person to carry out any function under or in connection with Part 8 of the Framework Regulations.
2
In this regulation, “Green Deal Ombudsman” has the meaning given in regulation
2(1) of the Framework Regulations.

Enforcement authorities
15
1
Every local authority is an enforcement authority for the purposes of these Regulations.
2
It is the duty of each enforcement authority to enforce these Regulations in its area.
3
The Scottish Ministers may appoint, subject to such conditions or limitations as they think fit, themselves or another person as an enforcement authority for the purposes of enforcement of the performance of duties under these Regulations by a local authority.
4
Where a local authority is appointed as an enforcement authority for the purposes of enforcement of the performance of duties under these Regulations by another local authority that local authority, as enforcement authority, has a duty to enforce these Regulations in the area of the other authority

Power to require production of energy performance certificate
16
1
An enforcement authority may require an owner who appears to it to be or to have been subject to the duty under regulation 5 in relation to a building or building unit to produce for inspection a copy of the energy performance certificate for that building or building unit.
2
The power conferred by paragraph (1) includes power–
a
to require the production in a legible documentary form of any energy performance certificate which is held in electronic form, and
b
to take copies of any energy performance certificate produced for inspection.
3
A requirement under this regulation may not be made more than 6 months after the last day on which the owner concerned appeared to the enforcement authority to be subject to the duty under regulation 5 in relation to the building or building unit.
4
An owner subject to a requirement under this regulation must comply with it within the period of 7 days beginning with the day after that on which it is made.
5
An owner is not required to comply with the requirement if the owner has a reasonable excuse for not complying.

Penalty charge notices
17
1
An enforcement authority may, if it believes that an owner has breached any duty under regulation 5, give a penalty charge notice to that owner.
2
A penalty charge notice may not be given–
a
unless the owner has failed to make an energy performance certificate available to a prospective buyer or tenant within a period of 9 days after a request for such a certificate was made to the owner; and
b
after the end of the period of 6 months beginning with the day on which it appeared to the enforcement authority that the duty under regulation 5 was breached.
2A
In addition to the limitations imposed by paragraph (2), a penalty charge notice may not be given in respect of a breach of any duty under regulation 5 occurring on or before 31st March 2009 where–
a
the owner has made a request for an energy performance certificate within a period of 7 days after the relevant time; and
b
the owner has made the energy performance certificate available to a prospective buyer or prospective tenant within a period of 9 days after obtaining the certificate.
3
A penalty charge notice must–
a
be in writing;
b
state the enforcement authority's belief that the owner has breached regulation 5;
c
give such particulars of the circumstances as may be necessary to give reasonable notice of the breach;
d
require that owner, within a period specified in the notice–
i
to pay a penalty charge specified in the notice; or
ii
to give notice to the enforcement authority requesting the authority to review the notice;
e
state the effect of regulation 21(3) (certificate as evidence of facts stated);
f
specify the person to whom and the address at which the penalty charge may be paid and the method or methods by which payment may be made; and
g
specify the person to whom and the address at which a notice requesting a review may be sent.
4
The amount payable as a penalty charge is–
i
£500 for dwellings or buildings (or building units) that are ancillary to dwellings; or
ii
£1000 in any other case.
5
The period specified under paragraph (3)(d) must not be less than 28 days beginning with the day after that on which the penalty charge notice is given.
6
The enforcement authority may, if it considers that the penalty charge notice ought not to have been given, give the recipient a notice withdrawing the penalty charge notice.
7
The enforcement authority must withdraw a penalty charge notice where regulation 18 applies.
8
Any sum received by an enforcement authority under this regulation shall accrue to that authority.
9
In paragraph (2A)(a)–
a
the reference to a request has the same meaning as in regulation 18(2); and
b
“the relevant time” has the same meaning as in regulation 18(3).

Penalty charge notice for failure to comply with regulation 5A
17A
1
An enforcement authority may, if it believes that an owner has breached any duty under regulation 5A, give a penalty charge notice to the owner.
2
Regulations 17(2)(b), (3) to (7) and 19 to 23 apply in relation to a penalty charge notice given under this regulation as they apply to a penalty charge notice given under regulation 17 subject to the modifications specified in paragraph (3).
3
The modifications are—
a
that regulation 17 applies as if––
i
the reference in paragraph (2)(b) and in paragraph (3)(b) to regulation 5 were a reference to regulation 5A; and
ii
the reference in paragraph (7) to regulation 18 were a reference to regulation 18A; and
b
the reference in regulation 20(4)(a) to regulation 5 were a reference to regulation 5A.
4
Any sum received by
an enforcement
authority under this regulation shall accrue to that authority.

Penalty charge notice for failure to comply with regulation 9
17B
1
An enforcement authority may, if it believes that an owner or occupier has breached any duty under regulation 9, give a penalty charge notice to the owner or occupier, as the case may be.
2
Regulations 17(2)(b), (3) to (6) and 19 to 23 apply in relation to a penalty charge notice given under this regulation as they apply to a penalty charge notice given under regulation 17 subject to the modifications specified in paragraph (3).
3
The modifications are—
a
that regulation 17 applies as if the reference in paragraph (2)(b) and in paragraph (3)(b) to regulation 5 were a reference to regulation 9; and
b
the reference in regulation 20(4)(a) to regulation 5 were a reference to regulation 9.
4
Any sum received by
an enforcement
authority under this regulation shall accrue to that authority.

Defence where energy performance certificate unobtainable
18
1
An owner is not liable to a penalty charge for a breach of the duty imposed by regulation 5 if it can be demonstrated that–
a
a request for an energy performance certificate was made at least 14 days before the relevant time, and despite all reasonable efforts and enquiries by the owner, the owner did not have possession or control of a valid energy performance certificate at the relevant time; or
b
in the case of a failure to make available an energy performance certificate to a prospective tenant–
i
the prospective tenant was seeking to lease the building or building unit due to an emergency which required the tenant's urgent relocation;
ii
at the relevant time the owner did not have possession or control of a valid energy performance certificate;
iii
there was insufficient time in which the owner could reasonably have been expected to obtain a certificate before letting the building or building unit to the prospective tenant; and
iv
the owner made a valid energy performance certificate available to the tenant as soon as reasonably practicable after letting the building or building unit.
2
In paragraph (1)(a) the reference to a request is to a request properly addressed to a person who usually provides or is likely to provide an energy performance certificate for the category of building or building unit in question and which includes such payment or an undertaking to make such payment as is usually necessary to obtain an energy performance certificate.
3
In this regulation “relevant time” means the point in time at which one of the events specified in paragraphs (a) to (c) of regulation 3 first occurs.

Defence where failure to comply with regulation 5A
18A
An owner is not liable to a penalty charge for a breach of the duty imposed by regulation 5A if it can be demonstrated that the instructions for the placement of the advertisement offering the building or building unit for sale or let included—
a
a requirement that the energy performance indicator for that building or building unit is stated in the advertisement; and
b
sufficient information to enable that energy performance indicator to have been stated in the advertisement.

Reviews
19
1
If, within the period specified under regulation 17(3)(d) the recipient of the penalty charge notice gives notice to the enforcement authority requesting a review, the authority must–
a
consider any representations made by the recipient and all other circumstances of the case;
b
decide whether to confirm or withdraw the notice; and
c
serve notice of its decision and the reasons for it on the recipient.
2
A notice under paragraph (1)(c) confirming the penalty charge notice must also state the effect of regulations 20 (appeal to the sheriff court) and 21 (recovery of penalty charges).
3
If, following a review, the enforcement authority is satisfied that–
a
the recipient did not commit the breach of duty specified in the notice; or
b
the notice was not given within the time allowed by regulation 17(2)(b); or
c
the notice did not comply with any other requirements imposed by these Regulations; or
d
in the circumstances of the case it was not reasonable for a penalty charge notice to be given to the recipient,
it must withdraw the penalty charge notice.

Appeal to the sheriff court
20
1
If after a review the penalty charge notice is confirmed by the enforcement authority, the recipient may appeal against the penalty charge notice to the sheriff court of the sheriffdom in which the building is situated.
2
An appeal against a penalty charge notice must be made within the period of 28 days beginning with the day after that on which the notice under regulation 19(1)(c) is given.
3
The sheriff may extend the period for appealing against the notice on cause shown.
4
An appeal must be on one (or more) of the following grounds–
a
that the recipient did not commit the breach of regulation 5 specified in the penalty charge notice;
b
that the notice was not given within the time allowed by regulation 17(2)(b) or does not comply with any other requirement imposed by these Regulations; or
c
that in the circumstances of the case it was not reasonable for the notice to be given to the recipient.
5
An appeal against a penalty charge notice must be by summary application.
6
The sheriff must determine an appeal against a penalty charge notice by upholding or quashing the notice.
7
If the penalty charge notice is withdrawn or quashed, the enforcement authority must repay any amount previously paid as a penalty charge in pursuance of the notice.
8
The recipient or the enforcement authority may, on a point of law only, appeal to the sheriff principal.

Recovery of penalty charges
21
1
The amount of the penalty charge is recoverable from the recipient of the penalty charge notice as a debt owed to the enforcement authority unless–
a
the notice has been withdrawn or quashed; or
b
the charge has been paid.
2
Proceedings for the recovery of the penalty charge notice may not be commenced–
a
before the end of the period specified in accordance with regulation 17(3)(d); and
b
if within that period the recipient of the penalty charge notice gives notice to the authority requesting the authority to review the penalty charge notice, such proceedings may not be commenced–
i
before the end of the period mentioned in regulation 20(2); and
ii
where the recipient appeals against the penalty charge notice, before the end of the period of 28 days beginning with the day on which the appeal is withdrawn or determined by the sheriff.
3
In proceedings for the recovery of the penalty charge, a certificate which–
a
purports to be signed by or on behalf of the person having responsibility for the financial affairs of the enforcement authority; and
b
states that payment of the penalty charge was or was not received by a date specified in the certificate,
is evidence of the facts stated.

Service of documents
22
1
A penalty charge notice issued under regulation 17(1) must be given by–
a
personal service; or
b
first class recorded delivery post.
2
Any other notice given under these Regulations–
a
must be in writing; and
b
may be given by post.
3
Any notice may be given–
a
in the case of a body corporate, to the secretary or clerk of that body; and
b
in the case of a partnership, to any partner or a person having control or management of the partnership business.

Offences relating to enforcement officers
23
1
A person who obstructs an authorised officer of an enforcement authority acting in pursuance of regulation 16 is guilty of an offence.
2
A person who, not being an authorised officer of an enforcement authority, purports to act as such in pursuance of regulation 16 or 17 is guilty of an offence.
3
A person guilty of an offence under this regulation is liable on summary conviction to a fine not exceeding level 5 on the standard scale.
STEWART STEVENSON
Authorised to sign by the Scottish Ministers
St Andrew's House,
Edinburgh
S.S.I. 2004/406 as amended by S.S.I. 2006/534 and S.S.I. 2007/166.
1994 c. 39.
O.J. No. L 1, 4.1.2003, p.65.
Reg. 6A(1)(c) and word inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 5(a)(ii)
Sum in reg. 10A(b) substituted (1.10.2017) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2017 (S.S.I. 2017/225), regs. 1(1), 2(2)(a) (with reg. 3)
Reg. 17(9) inserted (31.12.2008) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2008 (S.S.I. 2008/389), regs. 1, 2(2)(b)
Reg. 12A(2)(c)(ii) and word omitted (19.12.2015) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(3)
Reg. 15(3)(4) inserted (19.12.2015) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(6)
Reg. 11 substituted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2012 (S.S.I. 2012/190), regs. 1, 8
Words in reg. 17(4) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 15 (with reg. 19)
Reg. 12A(5) omitted (19.12.2015) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(3)
Words in reg. 6A(2) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 5(b)
Reg. 13 substituted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 6
Reg. 12A(2)(ba) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 8
Words in reg. 2 inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 3(1)(a)
Reg. 14A inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations2013 (S.S.I. 2013/12), regs. 1, 10
Words in reg. 2(1) inserted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 3(d)
Words in reg. 6(1)(d)(i) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(d) (with reg. 19)
Words in reg. 2(1) inserted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 3(c)
Reg. 6(6) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(h) (with reg. 19)
Words in reg. 3 inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 4 (with reg. 19)
Regs. 17A, 17B inserted (9.1.2013) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(2), 16 (with reg. 19)
Reg. 9 substituted (9.1.2013) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(2), 11 (with reg. 19)
Reg. 6(1)(ba)(bb) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(b) (with reg. 19)
Word in reg. 6A(1) omitted (27.1.2013) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 5(a)(i)
Regs. 12, 12A substituted for reg. 12 (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 5
Words in reg. 16 inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 14 (with reg. 19)
Reg. 10 substituted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2012 (S.S.I. 2012/190), regs. 1, 7 (as amended by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(3), 20(3) (with reg. 19))
Reg. 14 substituted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 7
Reg. 17(2A) inserted (31.12.2008) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2008 (S.S.I. 2008/389), regs. 1, 2(2)(a)
Words in reg. 2(1) inserted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 3(b)
Words in reg. 2 inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 3(1)(b)
Word in reg. 2(2) substituted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(b) (with reg. 19)
Reg. 13(2)(ca) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 9
Words in reg. 2 substituted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 3(1)(d)
Reg. 6(1)(c)(ca) substituted for reg. 6(1)(c) (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(c) (with reg. 19)
Words in reg. 2(1) omitted (1.10.2012) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2012 (S.S.I. 2012/190), regs. 1, 3(a)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2012 (S.S.I. 2012/190), regs. 1, 3(b)
Reg. 6(2) substituted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 4(c)
Words in reg. 17B(4) substituted (19.12.2015) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(9)
Reg. 6A inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 8 (with reg. 19)
Words in reg. 8(2) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 10 (with reg. 19)
Words in reg. 14(2) omitted (19.12.2015) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(5)
Reg. 7 substituted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 4
Words in reg. 17A(4) substituted (19.12.2015) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(8)
Words in reg. 2(1) inserted (21.12.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 3) Regulations 2012 (S.S.I. 2012/315), regs. 1, 3(a)
Words in reg. 18 inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 17 (with reg. 19)
Words in reg. 6(1)(a) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(a) (with reg. 19)
Words in reg. 2 inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 3(1)(e)
Words in reg. 10(5)(b) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 6(a)
Reg. 10A inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 12 (with reg. 19)
Reg. 6(7) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 4(d)
Words in reg. 6(1)(e) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 4(a)
Reg. 13(3) omitted (19.12.2015) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(4)
Words in reg. 11 substituted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 7
Reg. 10(5A) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 6(b)
Reg. 13(2)(d)(ii) omitted (19.12.2015) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(4)
Reg. 18A inserted (9.1.2013) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(2), 18 (with reg. 19)
Reg. 12(2) substituted (19.12.2015) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(2)
Reg. 5A inserted (9.1.2013) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(2), 6 (with reg. 19)
Reg. 6(4) substituted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(g) (with reg. 19)
Words in reg. 17(8) substituted (19.12.2015) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(7)
Reg. 12A(3) omitted (19.12.2015) by virtue of The Energy Performance of Buildings (Scotland) Amendment Regulations 2015 (S.S.I. 2015/386), regs. 1, 2(3)
Reg. 6(1)(e) substituted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 7(e) (with reg. 19)
Reg. 5 substituted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 5 (with reg. 19)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2012 (S.S.I. 2012/190), regs. 1, 3(c)
Reg. 6(1A) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 4(b)
Reg. 6A(3) inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 5(c)
Words in reg. 2 inserted (27.1.2013) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2013 (S.S.I. 2013/12), regs. 1, 3(1)(c)
Sum in reg. 10A(a) substituted (1.10.2017) by The Energy Performance of Buildings (Scotland) Amendment Regulations 2017 (S.S.I. 2017/225), regs. 1(1), 2(2)(a) (with reg. 3)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(a)(iv) (with reg. 19)
Words in reg. 2(1) omitted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(a)(vi) (with reg. 19)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(a)(i) (with reg. 19)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(a)(iii) (with reg. 19)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(a)(ii) (with reg. 19)
Words in reg. 2(1) inserted (1.10.2012) by The Energy Performance of Buildings (Scotland) Amendment (No. 2) Regulations 2012 (S.S.I. 2012/208), regs. 1(1), 3(a)(v) (with reg. 19)