. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Order revoked (14.12.2019) by The Plant Health (Official Controls and Miscellaneous Provisions) (Scotland) Regulations 2019 (S.S.I. 2019/421), reg. 1(1), sch. 6