PART 1

PRELIMINARY

Period for completion of works
16
1
Subject to paragraph (2) below, if the works are not completed within five years from the coming into force of this Order or such extended time as the Scottish Ministers may on the application of the Company allow, then on the expiration of that period or such extended time (as the case may be) the powers by this Order granted to the Company for making and maintaining the works shall cease except as to so much thereof as is then substantially commenced.
2
Nothing in paragraph (1) above shall apply to any works carried out under paragraph (3) of article 4 (Power to construct works) or article 6 (Subsidiary works) of this Order.