Scottish Statutory Instruments
2005 No. 577
WATER SUPPLY
The Scottish Water (Allt Ach Na Braighe) Water Order 2005
Made 9th November 2005
Coming into force 11th November 2005

The Scottish Ministers, in exercise of the powers conferred by sections 17(1), 29(1) and 107(1)(b) of the Water (Scotland) Act 1980 and of all other powers enabling them in that behalf, on the application of Scottish Water, hereby make the following Order:
1980 c. 45; section 17(1) was amended by the Local Government etc. (Scotland) Act 1994 (c. 39), section 180(1) and (2), Schedule 13, paragraph 119(10)(a) and Schedule 14, and by the Water Industry (Scotland) Act 2002 (asp 3) Schedule 6, paragraph 14(1) and (2); Section 107(1)(b) was amended by the Local Government etc. (Scotland) Act 1994, section 180(1) and (2), Schedule 13, paragraph 52(a) and by the Water Industry (Scotland) Act 2003 Schedule 6, paragraphs 61(a) and (b); Section 29(1) was amended by the Local Government etc. (Scotland) Act 1994, section 180(1) and (2), Schedule 13, paragraphs 19(a) and (b) and Schedule 14, and by the Water Industry (Scotland) Act 2002, Schedule 6, paragraphs 23(a), (b) and (c). See section 109(1) for definition of “local enactment”. The functions of the Secretary of State were transferred to the Scottish Ministers by virtue of section 53 of the Scotland Act 1998 (c. 46).

Citation and commencement
1. This Order may be cited as the Scottish Water (Allt Ach Na Braighe) Water Order 2005 and shall come into force on 11th November 2005.

Interpretations
2. In this Order:–
“the Act” means the Water (Scotland) Act 1980;
“approved” means approved by the Scottish Ministers;
“day” means a period of 24 hours reckoned from midnight;
“deposited plan” means the plan, prepared in triplicate, docqueted and signed as relevant to this Order and marked “the Scottish Water (Allt Ach Na Braighe) Water Order 2005”, one copy of which is deposited in the office of the Scottish Executive, Victoria Quay, Edinburgh, one copy in the other in the head office of Scottish Water at Castle House, 6 Castle Drive, Carnegie Campus, Dunfermline, Fife, KY11 8GG, and one copy in the Scottish Water Inverness Area Office at 31 Henderson Drive, Longman North, Inverness IV1 1TR;
“gauge” includes a gauge, weir or other apparatus for measuring the flow of water;
“intake” includes any work by which water is taken by Scottish Water for the purpose of the undertaking;
“Scottish Water” means the body corporate established by section 20(1) of the Water Industry (Scotland) Act 2002;
2002 asp 3, as amended by the Water Services etc. (Scotland) Act 2005 (asp 3).
“undertaking” means the water undertaking for the time being of Scottish Water; and
“works” means the works described in Schedule 1 to this Order and shown on the deposited plan.

Incorporation and application of provisions of Schedule 4 to the Act
3. The provisions of paragraphs 2 and 10(3) of Schedule 4 to the Act, modified and adapted to read as set out in Schedule 2 to this Order shall apply to the undertaking insofar as affected by the provisions of this Order, and the terms used in the provisions of those paragraphs, as so modified and adapted, which are defined in this Order, shall have the same meaning as in this Order.
Paragraph 2 of Schedule 4 was amended by the Roads (Scotland) Act 1984 (c. 54), Schedule 9, paragraph 81(15)(a); paragraph 10(3) was amended by the Criminal Justice Act 1982 (c. 48), Schedule 15, paragraph 27 and by the Criminal Procedure (Consequential Provisions) (Scotland) Act 1995 (c. 40), Schedule 2.

Water rights
4. Subject to the provisions of this Order, Scottish Water may for the purposes of the undertaking, and by means of an existing intake located at Ordnance Survey National Grid Reference NR 2057 9063, take water from the Allt Ach Na Braighe in the area of the Highland Council.
5. (1) During the construction of the works, Scottish Water may take from the Allt Ach Na Braighe such water as it may require for such construction.
(2) After completion of the works Scottish Water may, in any day, take from the Allt Ach Na Braighe a quantity of water not greater than 280 cubic metres, as measured and recorded by a gauge (Work No 2).
6. If the power to take water conferred by this Order has not been exercised by 31st December 2007, the said power shall cease.

Revocation
7. The County of Ross and Cromarty (Allt Ach a'Braighe) Water Order 1968 made under the seal of the Secretary of State for Scotland, dated 23rd April 1968, approving the Minute of Agreement between Philip Sydney Henman and the County Council of Ross and Cromarty dated 7th and 26th September 1967, is hereby revoked with effect from 31st December 2007.
A copy of the Order is available upon request from Scottish Water, Castle House, 6 Castle Drive, Carnegie Campus, Dunfermline, Fife.
ANDREW SCOTT
A member of the staff of the Scottish Ministers
Victoria Quay, Edinburgh
9th November 2005
SCHEDULE 1 The works referred to in this Order and shown on the deposited plan are:–
Works No. 1	Fitting of a new cover upon an existing intake chamber located at Ordnance Survey National Grid Reference NC 0500 0621.
Works No. 2	Installation of a flow meter into an existing meter chamber located on a supply pipe approximately 21 metres downstream of the existing intake chamber.
Article 2
SCHEDULE 2 The modifications and adaptations of Schedule 4 to the Act referred to in this Order are–
(1) For paragraph 2 of Schedule 4 substitute–

“In the construction of the works described in Schedule 1 to the Scottish Water (Allt Ach Na Braighe) Water Order 2005, Scottish Water may deviate laterally to any extent not exceeding the limits of deviation shown on the deposited plan and it may deviate vertically from the levels shown on the said plan to any extent:
Provided that–
(a) no control building shall be constructed at a greater height above the general surface of the ground than that shown on the deposited plan and 2 metres in addition thereto; and
(b) except for the purposes of crossing a stream, canal, dyke, watercourse or railway, or of crossing any lands where the consent of all persons interested in those lands has been obtained, no pipe or other conduit or aqueduct shall be raised above the surface of the ground otherwise than in accordance with the deposited plan.”

; and
(2) For paragraph 10(3) of Schedule 4 substitute–

“If Scottish Water–
(a) fails to construct or maintain in good order any such gauge as is mentioned in the Scottish Water (Allt Ach Na Braighe) Water Order 2005, or refuses to allow any person interested to inspect and examine any such gauge or any records made thereby or kept by it in connection therewith or to take copies of any such records; or
(b) takes any water contrary to the provisions of the Scottish Water (Allt Ach Na Braighe) Water Order 2005,
it shall, without prejudice to its civil liability, if any, to a person aggrieved, be liable, in the case of an offence under sub paragraph (a) of this paragraph, on summary conviction to a fine not exceeding level 3 on the standard scale, and, in the case of an offence under sub paragraph (b) of this paragraph–
(i) on summary conviction, to a fine not exceeding the statutory maximum; and
(ii) on conviction on indictment to a fine.”.

Article 2