Scottish Statutory Instruments
2005 No. 331
PESTICIDES
The Plant Protection Products (Scotland) Regulations 2005 (revoked)
Regulations revoked (24.9.2011) by The Plant Protection Products Regulations 2011 (S.I. 2011/2131), reg. 1(1), Sch. 5 (with reg. 30)
Made 8th June 2005
Laid before the Scottish Parliament 9th June 2005
Coming into force 1st July 2005

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation, commencement and extent
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Prohibitions
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Applications concerning active substances
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Standard approvals
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

General requirements for granting standard approvals
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Provisional approvals
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Emergency approvals
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Approvals for research and development
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Extensions of approved use
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Mutual recognition of approvals
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Provisional restrictions and prohibitions
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Applications, reviews, revocations and modifications
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Notification of information on potentially dangerous effects
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Data protection
15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Duplication of experiments
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Confidentiality
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Packaging
18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Labelling
19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Seizure and disposal of plant protection products
20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

General offences
21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Penalties
22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

General defence of due diligence
23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Enforcement
24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Service of documents
25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Agency arrangements
26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transitional provisions
27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Disapplication
28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation
29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 INSTRUMENTS AMENDING COUNCIL DIRECTIVE 91/414/EEC
Regulation 2

PART 1 Instruments in force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART II Instruments coming into force on 1st April 2007
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART III Instruments coming into force on 1st July 2007
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART IV Instruments coming into force on 1st August 2007
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART V Instruments coming into force on 1st November 2007
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART VI Instruments coming into force on 1st December 2007
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART VII Instruments coming into force on 1st February 2008
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART VIII Instruments coming into force on 1st April 2008
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 NON-CONFIDENTIAL INFORMATION
Regulation 17
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 LABELLING
Regulation 19
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 TRANSITIONAL PROVISIONS
Regulation 27

Application of these Regulations and of the 1986 Regulations to relevant plant protection products
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of Annex I decisions on the placing on the market and use of relevant plant protection products which are not approved pesticides
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of a refusal to include an active substance in Annex I on relevant plant protection products which are approved pesticides
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of a decision to include active substances in Annex I on relevant plant protection products which are approved pesticides
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation of pesticide approval
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of revocation on the placing on the market and use of the product
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Notifications
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .