Interpretation
2
1
In this Order, “codend” has the meaning given in Article 6 of
Regulation (EU) 2019/1241
of the European Parliament and of the Council of 20 June 2019 on the conservation of fisheries resources and the protection of marine ecosystems through technical measures.
2
For the purposes of this Order, the mesh of a net or netting shall be measured in accordance with Commission Regulation (EC) No. 517/2008 laying down detailed rules for the implementation of Council Regulation (EC) No. 850/98 as regards the determination of the mesh size and assessing the thickness of twine of fishing nets.
Art. 2 in force at 1.7.2004, see art. 1(1)
Art. 2(2) substituted (28.3.2019) by The Fisheries (EU Exit) (Scotland) (Amendment) (No. 2) Regulations 2019 (S.S.I. 2019/69), regs. 1(2)(a), 4(2)
Art. 2(1) substituted (21.12.2020) by The Fisheries (Technical Conservation Measures) (EU Exit) (Scotland) (Amendment etc.) Regulations 2020 (S.S.I. 2020/367), regs. 1(2), 4(2)