Scottish Statutory Instruments
2004 No. 143
AGRICULTURE
The Organic Aid (Scotland) Regulations 2004 (revoked)
Regulations revoked (28.2.2019) by The Environment, Food and Rural Affairs (Miscellaneous Amendments and Revocations) (Scotland) Regulations 2018 (S.S.I. 2018/391), reg. 1(1), sch. Pt. 2
Made 24th March 2004
Laid before the Scottish Parliament 25th March 2004
Coming into force 1st May 2004

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation, commencement and extent
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Application
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Aid for organic farming
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Conditions of eligibility for conversion grant
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Undertakings by applicants for conversion grants
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Undertakings by applicants for capital grants
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Conditions of eligibility for maintenance grant
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Undertakings by applicants for maintenance grants
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Crofters common grazings
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Applications for grants
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Restrictions on acceptance of applications
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Determination of applications for aid
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amounts of payments and claims
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Phased conversions and phased entry into the maintenance part of the scheme
15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Change of occupation
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Powers of authorised persons
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Breaches of undertakings etc.
18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Other cases in which recovery etc. powers apply
19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Scottish Ministers' powers of recovery etc.
20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Recovery of interest
21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Sums payable to the Scottish Ministers to be recoverable as a debt
22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Offences and penalties
23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Notices
24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Right of appeal
25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment to the 1994 Regulations
26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 CAPITAL ACTIVITIES
Regulations 2(1), 7(a) and 11(1)(c)(iii)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 DEFINITION OF REGULATION 2092/91
Regulation 2(1)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 PAYMENTS OF CONVERSION GRANT
Regulations 3(2) and 14(2)(a)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3A PAYMENTS OF CONVERSION GRANT FOR ANY UNDERTAKING GIVEN UNDER (I) THESE REGULATIONS OR (II) THE 1994 REGULATIONS AND GIVEN AFTER 31st DECEMBER 2002
Regulations 3(2A) and 14(2)(a)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 THE STANDARD OF GOOD FARMING PRACTICE
Regulations 6(f) and 9(f)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 5 MAINTENANCE OBLIGATIONS
Regulation 9(e)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 6 PAYMENTS OF CAPITAL GRANT
Regulation 14(2)(b)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 7 PAYMENTS OF MAINTENANCE GRANT
Regulation 14(2)(c)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 8 PHASING DATES AND PERIODS
Regulation 15
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .