SCHEDULE 4

TRANSITIONAL PROVISIONS
Regulation 27

Application of these Regulations and of the 1986 Regulations to relevant plant protection products
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of Annex I decisions on the placing on the market and use of relevant plant protection products which are not approved pesticides
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of a refusal to include an active substance in Annex I on relevant plant protection products which are approved pesticides
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of a decision to include active substances in Annex I on relevant plant protection products which are approved pesticides
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation of pesticide approval
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Effect of revocation on the placing on the market and use of the product
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Notifications
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.7.2005) by The Plant Protection Products (Scotland) Regulations 2005 (S.S.I. 2005/331), regs. 1(1), 29 (with sch. 4)