2003 No. 334

ANIMALS

ANIMAL HEALTH

The Diseases of Animals (Approved Disinfectants) Amendment (Scotland) Order 2003
Made
26th June 2003
Coming into force
30th June 2003
The Scottish Ministers, in exercise of the powers conferred by sections 1, 7(1) and (2) and 23(f) and (g) of the Animal Health Act 1981 , and of all other powers enabling them in that behalf, hereby make the following Order:

Citation, commencement and extent
1
1
This Order may be cited as the Diseases of Animals (Approved Disinfectants) Amendment (Scotland) Order 2003 and shall come into force on 30th June 2003.
2
This Order extends to Scotland only.

Amendments to the Diseases of Animals (Approved Disinfectants) Order 1978
2
1
The Diseases of Animals (Approved Disinfectants) Order 1978 shall be amended as follows:–
a
in article 3(2) and (4) (special disease and general orders), after “Schedule 1” insert “or Schedule 2”;
b
in article 4 (approved disinfectants), for “Schedule 1” substitute “either Schedule 1 or Schedule 2”;
c
at the end of article 5(3) (disinfectants listed in Schedule 1) insert–
- , unless it is then added to the disinfectants listed in column 1 of Schedule 2
.
d
after article 5 insert–

Disinfectants listed in Schedule 2
6
1
A disinfectant listed in column 1 of Schedule 2 is approved for use, and may be used, only under and for the purposes of an order in the column relating to which (in that Schedule) a dilution rate is specified opposite the name of that disinfectant, and may, subject to the provisions of article 8, be used under an order only at the dilution rate so specified.
2
A disinfectant listed in column 1 of Schedule 2 shall remain an approved disinfectant until 31st August 2003.
;
e
for Schedule 1 (approved disinfectants), substitute Schedule 1 to this Order; and
f
after Schedule 1 insert the Schedule set out in Schedule 2 to this Order.

Revocations
3
1
Article 2(4)(a), (5), (6), (7) and (9) of the Diseases of Animals (Approved Disinfectants) Amendment (Scotland) Order 2001 is revoked.
2
The Diseases of Animals (Approved Disinfectants) Amendment (No. 2) (Scotland) Order 2001 is revoked.
ALLAN WILSON
Authorised to sign by the Scottish Ministers
St Andrew’s House, Edinburgh
26th June 2003
SCHEDULE 1

Schedule to be substituted for Schedule 1 to the Diseases of Animals (Approved Disinfectants) Order 1978
Article 2(e)
SCHEDULE 1

APPROVED DISINFECTANTS
Articles 4 and 5
Orders in respect of which use is approved; and dilution rates
Disinfectant | Foot and Mouth Disease Orders | Swine Vesicular Diseases Orders | Diseases of Poultry Order | Tuberculosis Orders | General Orders
* The volume of mls. of water to which 1 g of the product is to be added.
Action Iodophor Disinfectant (New Formulation) | 525 | 400 | 150 | 15 | 110
Agilan Red Label | 550 | 600 | 125 | 30 | 180
Agri Disinfex | 550 | 600 | 125 | 30 | 180
AgriGene | – | – | – | – | 50
Agrimar Iodophor Disinfectant | 550 | 600 | 125 | 30 | 180
Agrisept MC Tabs | 271 | 448 | 271 | – | 450
Alzogur | – | – | – | – | 2
Alodine (New Formulation) | 525 | 400 | 150 | 15 | 110
Alpharma Vetrechlor | 271 | 448 | 271 | – | 450
Alpharma Vetredine | 550 | 600 | 125 | 30 | 180
Alpharma Vetrekill | 60 | 300 | 150 | 10 | 50
Alpharma Vetrekill 200 | 840 | 400 | 200 | 29 | 82
Alpharma Vetroxide PA | 99 | 20 | 350 | 61 | 158
Annihilate | 50 | 30 | 20 | – | 30
Annihilate ACR | 50 | 30 | 20 | – | 30
Antec Ambicide | – | – | – | – | 30
Antec Black Fluid | – | – | 52 | – | 60
Antec Chicgard | – | – | – | – | 31
Antec Farm Fluid | 219 | 100 | 39 | 24 | 29
Antec Farm Fluid S | 700 | 200 | 200 | 50 | 115
Antec Hipodine | 450 | 300 | 130 | 30 | 180
Antec Hyperox | 150 | 50 | 375 | 100 | 179
Antec Longlife | – | – | 60 | – | 60
Antec Longlife 200 | – | 160 | 200 | – | –
Antec Longlife 250 S | 500 | 200 | 250 | 48 | 90
Antec New Formula Farm Fluid | 300 | 110 | 70 | 30 | 65
Antec New Formula Farm Fluid Extra | 250 | 150 | 80 | 60 | 85
Antec New Formula White Fluid | – | – | 45 | 83 | 103
Antec Ovation | – | – | – | – | 46
Antec Safehands | – | – | – | – | 2
Antec Virkon E | 1300 | 200 | 280 | – | 120
Antec Virkon S | 1300 | 200 | 280 | – | 120
Antec Virudine | 600 | 650 | 140 | 51 | 125
Antigermen Potente | 525 | 400 | 150 | 15 | 110
Avi-Cleanse | 240 | 300 | 80 | 25 | 100
Bactacol KK Disinfectant (New Formulation) | 80 | 250 | 190 | – | –
Bactipal 5.22 | 500 | 80 | 150 | 135 | 200
Bactipal DB | 500 | 80 | 150 | 90 | 178
Ballista | 200 | – | 200 | – | 200
Barrier V1 | – | – | 50 | – | 40
Battles Black Disinfectant Fluid | – | – | 45 | – | 60
Battles Iofarm Iodophor Disinfectant & Dairy Detergent Steriliser | 550 | 600 | 125 | 30 | 180
Battles Universal Disinfectant Fluid | 300 | – | 60 | 37 | –
Battles White Disinfectant Fluid | – | – | 50 | 50 | 60
Betane Plus | – | – | 50 | – | 15
Biocid | 525 | 400 | 150 | 15 | 110
Biocid 30 | 550 | 600 | 125 | 30 | 180
Bio – Cleanse | 1100 | 120 | 150 | – | 100
Bio-Dine | – | – | 145 | – | –
Bio-Guard | – | – | 80 | – | –
Bio-Kill | – | – | 365 | – | –
Bio-Phen | – | 175 | 190 | – | –
Bio-Phen Plus | – | | 210 | – | –
Bio-Shield | – | – | 155 | – | –
Biotal Pet Disinfectant | – | – | – | – | Use undiluted
Bio-VX | – | – | 285 | – | –
Black Disinfectant | – | – | 41 | – | 80
Black Disinfectant 34+ | – | – | – | – | 77
Blitz | 800 | 160 | 145 | 44 | 256
Breaker | 200 | – | 200 | – | 200
C S Disinfectant | – | – | 65 | – | 40
Carela Bio-Des | 99 | – | – | – | –
Carela Bio Plus | 9 | – | – | – | –
Cascade Disinfectant | 800 | 160 | 145 | 44 | 256
Centiklene Black Fluid Disinfectant | – | – | 20 | – | –
Citric Acid BP | 500 | – | – | – | –
Citrox | – | – | 0.66 | – | –
Clearsol | – | – | – | 45 | –
Clinidine | 320 | – | 140 | – | –
Combat 2 | 550 | 600 | 125 | 30 | 180
Commando (New Formulation) | 80 | 250 | 190 | – | –
Cromessol New Animal Health Care Disinfectant (New Formulation) | 80 | 250 | 190 | – | –
D50 | 800 | 160 | 145 | – | 256
Deocide PA Disinfectant (2) | 800 | 160 | 145 | 44 | 256
Deosan Iodel FD | 215 | 234 | 130 | 26 | 147
Deptil AF | – | – | 100 | – | –
Disteola | 240 | 300 | 80 | 25 | 100
Divosan DB | – | – | 60 | – | 49
Emprasan Approved Iodine Disinfectant | – | – | – | – | 111
Envirocare A | 99 | 99 | 99 | – | 99
Envirocide | 550 | 600 | 125 | 30 | 180
Enviroguard | 60 | 300 | 150 | 10 | 50
Equigard | – | 50 | 100 | – | 22
Equisept | 271 | – | – | – | 450
ERFS White Disinfectant Fluid | – | – | 50 | 50 | 60
Euractiv S+ | 99 | 300 | 150 | 90 | 37
Everbrite FG Extra | – | – | 10 | – | –
F10SC Veterinary Disinfectant | – | – | 35 | – | 9
F10SC General Farm Disinfectant | 499 | – | – | – | –
FAM | 525 | 500 | 100 | 15 | 110
FAM (New Formulation) | 525 | 400 | 150 | 15 | 110
FAM 30 | 550 | 600 | 125 | 30 | 180
FAM 30C | 891 | 970 | 200 | 48 | 290
Farmodyne | 550 | 600 | 125 | 30 | 180
Farm Oxysan Plus | 200 | 30 | 300 | – | 300
Farmcare 95 (New Formulation) | 80 | 250 | 190 | – | –
FarmKlear | 80 | 250 | 190 | – | –
Farmsan | 550 | 600 | 125 | 30 | 180
FH7 | 60 | 300 | 150 | 10 | 50
Formalin BP (Containing not less than 34% Formaldehyde) | 9 | 9 | – | – | –
Genus Universal (New Formulation) | 550 | 600 | 125 | 30 | 180
GeoSIL | – | – | – | – | 9
Germacert FG Plus | – | – | 10 | – | –
GPC8 | 80 | – | 200 | – | –
GPC8 (New Formulation) | 80 | 250 | 190 | – | –
Halamid | 200 | 90 | 1000 | 20 | 300
Hemex Chlor Powder | – | 2000 | 500 | – | 530
Hemexol Iodine Liquid | 160 | 140 | 100 | – | 110
Hemexol Iodine Liquid Plus | – | 800 | 200 | – | 200
Hemexol Liquid G | – | 50 | 75 | – | 18
Hemexol V 260 | – | 220 | 260 | – | 103
Hemexol Virucidal Powder | 1300 | – | – | – | –
HPPA | – | – | 400 | – | –
Hycolin | – | – | 40 | – | 28
Hyprelva 4+ | – | 400 | 90 | 16 | 37
Hyprelva SF | 99 | 300 | 150 | 90 | 37
Hyspray PA 5 | 99 | 20 | 350 | 61 | 158
Impact | 1300 | 300 | 300 | – | 112
Incidin AL | 30 | 400 | 90 | – | 19
Incidin OXI | 500 | 80 | 150 | – | 178
Incidin PD | – | – | 20 | – | 32
Intercept | 150 | 450 | 200 | – | –
Iodel FD II | 450 | 500 | 145 | – | 150
Iodet | 525 | 500 | 100 | 15 | 110
Iodosure Bio | 240 | 160 | 110 | 25 | 25
Jewel-Black 34 | – | – | – | – | 77
Jeyes Fluid | – | – | 30 | – | 50
Kennel Safe Disinfectant (New Formulation) | 80 | 250 | 190 | – | –
Kick Start (2) | 800 | 160 | 145 | 44 | 256
Kilcrobe WO Disinfectant Fluid Special Grade | – | – | – | – | 99
Killgerm Black Disinfectant RW Coefficient 18/22 | – | – | 41 | – | 80
Killgerm Iodair | 250 | 260 | 61 | – | –
Killgerm Lysol BP | – | – | 50 | 39 | 49
Killgerm White Farm Disinfectant | – | – | 21 | 66 | 100
Kirbychlor | 2 71 | 448 | 271 | – | 450
Life Guard (New Formulation) | 80 | 250 | 190 | – | –
Lifeline | – | 50 | 75 | – | 18
Lindores 30 | 550 | 600 | 125 | 30 | 180
Lysol BP 1968 | 9 | – | 39 | 39 | 49
Lysovet PA | 50 | – | 50 | – | –
Macroclor | 271 | 448 | 271 | – | 450
Macroclor 1000 | – | 2000 | 500 | – | 530
Macrodyne 200 | – | 800 | 200 | 40 | 200
Macrokil 200 | – | 300 | 220 | – | 64
Macroline-500 | – | 220 | 260 | – | 103
Macromist | – | – | 50 | – | 15
Maskells Omnicide | 60 | 300 | 150 | 10 | 50
Master SVD Solution | – | 9 | – | – | –
Maxi Guard | 240 | 300 | 80 | 25 | 100
Micro-Chlor | – | 100 | 250 | – | 210
Microcide 755N | – | – | 50 | – | 15
Microdine | 160 | 140 | 100 | – | 110
Microl-Plus | – | – | 60 | 65 | 70
Micro-Quat | – | – | – | – | 15
Milton Double Concentrate | – | 100 | – | – | 25
Mira 8 | 80 | 250 | 190 | – | –
Mira 30 | 550 | 600 | 125 | 30 | 180
MP36 | 99 | 99 | 99 | – | 99
Novagen FP | 240 | 180 | 80 | 22 | 145
Omnicide | 60 | 300 | 150 | 10 | 50
Omnicide Extra | – | 300 | 175 | 38 | 27
Ortho-phosphoric Acid (Technical Grade) | 330 | – | – | – | –
Ovitek Biocidal Sol. Concentrate | – | – | 200 | – | 25
Oxykil | 800 | 160 | 145 | – | 256
Oxysan Max | – | – | 365 | – | –
P100 (New Formulation) | 80 | 250 | 190 | – | –
Parvocide Plus | 60 | 300 | 150 | 10 | 50
Peratol | 75 | 75 | 100 | 75 | 200
Perbac Farm | 800 | 160 | 145 | – | 256
Peroxide | 1320 | 220 | – | – | –
Pet Safe | – | – | Use undiluted | – | –
Pet Vsan | 1100 | 120 | 150 | – | 100
Phenoxide | – | – | 260 | – | –
Phoraid Disinfectant | – | – | – | – | 25
Phor-Vet | – | – | – | – | 25
Pinalene | – | – | – | – | 11
Polykil+ Disinfectant | – | 300 | – | – | 180
Powercide | 1300 | 300 | 300 | – | 112
Powerkill | 1300 | 300 | 300 | – | 112
Pro – Cleanse | 1100 | 120 | 150 | – | 100
Prodophor | – | 700 | 155 | – | 160
Prosept | – | 240 | 130 | – | –
Protekol | – | – | 250 | – | –
ProVSan | 1100 | 120 | 150 | – | 100
Proxide | – | 250 | 400 | – | 160
Proxitane AHC (2) | 800 | 160 | 145 | 44 | 256
Prozone | – | – | 500 | – | 256
Purogene | 250 | 240 | 20 | 20 | 22
QC Iodocleanse | – | – | 140 | – | –
QC Virukill 260 | – | – | 260 | – | –
Quatdet Clear | – | – | – | – | 13
Rapicid | 550 | 600 | 125 | 30 | 180
Response 904 Vet | – | – | 29 | – | –
Ryodophor SP | 240 | 160 | 91 | 25 | 145
San Protect WS | 99 | 300 | 150 | 90 | 37
San-5-Pine | – | – | – | – | 11
Secure Iodophor Disinfectant | 150 | – | 30 | – | –
Septrivet 17 | 299 | 299 | 449 | – | 299
Sodium Carbonate (Decahydrate) Complying with BS 3674 of 1963 | 24 | – | – | – | –
Sodium Hydroxide | – | 100 | – | – | –
Somplex Detsan | – | – | – | – | 8
Sorgene 5 | 75 | 75 | 100 | 75 | 200
Sorgene Biodine | 215 | 234 | 130 | 26 | 147
Stableguard | 150 | 450 | 200 | – | 200
Stable Safe Disinfectant (New Formulation) | 80 | 250 | 190 | – | –
Steril Tabs | 200 | – | 200 | – | 200
Sterilite 2000 | 1300 | 300 | 300 | – | 112
Sterilite Farm Disinfectant Extra | 840 | 400 | 200 | 29 | 82
Sterilite PA | 800 | 160 | 145 | 44 | 256
Sterilite Virucidal Disinfectant | 60 | 300 | 150 | 10 | 50
Sterilite White Disinfectant | – | – | 45 | – | –
Sudol | – | – | 60 | 65 | 70
Sulphamic Acid | 500 | – | – | – | –
Supercide | 150 | 450 | 200 | – | –
Supercide Max | – | – | 155 | – | –
Supercide Plus | – | 300 | 175 | – | 27
Superdine | 550 | 600 | 125 | 30 | 180
Superdine Plus | – | – | 145 | – | –
Super Fluid F | – | 175 | 190 | – | –
Superguard | 150 | 450 | 200 | – | 200
Superkill | – | 50 | 100 | – | 22
Superkill Plus | – | – | 80 | – | –
Superperacetic | 800 | 160 | 145 | – | 256
Superperacetic Plus | – | – | 365 | – | –
Super Strong F | – | – | 210 | – | –
Super Virucidal | – | – | 285 | – | –
SWC Bacto Detsan Defoamed | 20 | 10 | – | – | 10
SWC Bacto Detsan | 20 | 10 | – | – | 10
SWC Broadol (New Formulation) | 80 | 250 | 190 | – | –
SWC Maxikleen | 600 | 400 | 100 | 45 | 43
SWC V3 | 1300 | 300 | 300 | – | 112
Tego 2000 | – | – | – | – | 32
Tego 2001 | – | – | – | | 16
Tegodor Farm | – | – | 51 | – | –
Terminal Black-Black Fluid RW 34 | – | – | – | – | 77
Terminol | – | – | – | – | 33
TK10 | 150 | 450 | 200 | – | –
TK12 | – | 50 | 100 | – | 22
Total | 50 | 30 | 20 | – | 30
Total Farm Disinfectant | 550 | 600 | 125 | 30 | 180
V26 | 200 | 200 | 300 | 105 | 200
Vanodin | 525 | 400 | 150 | 15 | 110
Vanodine | 525 | 400 | 150 | 15 | 110
Vanodine FAM | 525 | 400 | 150 | 15 | 110
Vanodox | 200 | 30 | 300 | – | 300
Venno FF Super | 50 | – | 150 | 25 | 88
Vesphene D39 | 10 | – | 50 | 70 | 55
Vibacide | 100 | – | 40 | 6 | 17
Viraguard (New Formulation) | 80 | 250 | 190 | – | –
Virex | 1300 | 200 | 300 | – | 112
Virkon Professional | 1300 | 200 | 280 | – | 120
VI-RID | – | – | 10 | – | –
Virochlor | 271 | 448 | 271 | – | 450
Viro-Cid | 100 | 250 | 150 | 50 | –
Virofree | 200 | – | 300 | – | 150
Viroguard | – | – | 175 | – | –
Virokill | 60 | 300 | 150 | 10 | 50
Virophen | – | 200 | 210 | – | –
Virophen Plus | – | – | 240 | – | –
Virophor 2.8% | – | – | 185 | – | –
Viroshield | – | – | 165 | – | –
Viroxide Super | 1320 | 220 | – | – | –
Virucidal Extra | 1300 | 300 | 300 | – | 112
Virucidal Extra Mk 2 | – | 200 | 300 | – | 90
Virucidal Plus | 280 | 110 | 150 | – | 77
Virudine | – | – | 140 | – | –
Zal Fluid | – | – | – | – | 77
Zal GQ Disinfectant | 60 | 300 | 150 | 10 | 50
Zal Perax (2) | 800 | 160 | 145 | 44 | 256
Zoetox 5 | – | – | 50 | – | 50
SCHEDULE 2

Schedule to be added to the Diseases of Animals (Approved Disinfectants) Order 1978
Article 2(f)
SCHEDULE 2

APPROVED DISINFECTANTS SUBJECT TO TRANSITIONAL PROVISIONS
Articles 4 and 6
Orders in respect of which use is approved; and dilution rates
Disinfectant | Foot and Mouth Disease Orders | Swine Vesicular Disease Orders | Diseases of Poultry Order | Tuberculosis Orders | General Orders
Action Iodophor Disinfectant | 525 | 500 | 100 | 15 | 110
Agrimar White Fluid | – | – | 40 | 79 | 111
Alodine | 525 | 500 | 100 | 15 | 110
Bactacol KK Disinfectant | 80 | – | 200 | – | –
Carbo White Disinfectant | – | – | 40 | 79 | 111
Commando | 80 | – | 200 | – | –
Cromessol New Animal Health Care Disinfectant | 80 | – | 200 | – | –
Defender | – | – | 40 | 79 | 111
Emprasan Approved White Disinfectant | – | – | 40 | 79 | 111
Evans White Disinfectant | – | – | 40 | 89 | 111
Farmcare 95 | 80 | – | 200 | – | –
Farm Disinfex + | – | – | 40 | 79 | 111
F&M Cept | 150 | 450 | 200 | – | 200
Hycovet W24 | – | – | 60 | 91 | 113
Kennel Safe Disinfectant | 80 | – | 200 | – | –
Life Guard | 80 | – | 200 | – | –
Marbolic White Disinfectant | – | – | 40 | 79 | 111
P100 | 80 | – | 200 | – | –
Rygentas Farm Disinfectant | – | – | 40 | 79 | 111
Sorgene White | – | – | 40 | 79 | 111
Stable Safe Disinfectant | 80 | – | 200 | – | –
Sterilite White Farm Disinfectant | – | – | 40 | 79 | 111
Superfine White Disinfectant | – | – | 40 | 79 | 111
Superwhite Plus Farm Disinfectant | – | – | 40 | 79 | 111
SWC Broadol | 80 | – | 200 | – | –
SWC Super White | – | – | 40 | 79 | 111
Unilite | – | – | 40 | 79 | 111
Vanodine Farm Disinfectant | – | – | 40 | 79 | 111
Vetrechlor | – | 448 | 271 | – | 450
Vetredine | 550 | 600 | 125 | 30 | 180
Vetrekill | 60 | 300 | 150 | 10 | 60
Vetrekill 200 | 840 | 400 | 200 | 29 | 82
Vetrewhite | – | – | 40 | 79 | 111
Vetroxide PA | – | 20 | 100 | 61 | 158
Viraguard | 80 | – | 200 | – | –
White Disinfectant | – | – | 40 | 79 | 111
White Farm Disinfectant | – | – | 40 | 79 | 111
Xtra Germicide | – | – | 40 | 79 | 111
Zal Germicide | – | – | 40 | 79 | 111
(This note is not part of the Order)
This Order, which extends to Scotland only, amends the Diseases of Animals (Approved Disinfectants) Order 1978 (“the 1978 Order”). Its effects are to substitute for Schedule 1 to the 1978 Order the Schedule 1 in this Order and to add a Schedule 2 to the 1978 Order (article 2). Schedule 1 provides an updated list of disinfectants approved by the Scottish Ministers. Schedule 2 lists disinfectants which, although no longer approved, can continue to be used as approved disinfectants until 31st August 2003.
The Order also makes consequential amendments and revocations (articles 2 and 3).
This Order was notified in draft to the European Commission in accordance with Directive 98/34/EC (O.J. No. L 204, 21/07/98, p.37) as amended by Directive 98/48/EC (O.J. No. L 217, 05/08/98, p.18).
A Regulatory Impact Assessment has not been prepared in respect of this Order.
1981 c. 22; see section 86(1) for the definition of “the Ministers”. The functions of the Secretary of State were transferred to the Scottish Ministers by virtue of section 53 of the Scotland Act 1998 (c. 46).
S.I. 1978/32, as last relevantly amended by S.I. 1978/934 and 1999/919, and S.S.I. 2001/45 and 51.
A previous article 6 was omitted by S.S.I. 2001/45.
S.S.I. 2001/45.
S.S.I. 2001/51