Scottish Statutory Instruments
2003 No. 334
ANIMALS
ANIMAL HEALTH
The Diseases of Animals (Approved Disinfectants) Amendment (Scotland) Order 2003
Made 26th June 2003
Coming into force 30th June 2003

The Scottish Ministers, in exercise of the powers conferred by sections 1, 7(1) and (2) and 23(f) and (g) of the Animal Health Act 1981, and of all other powers enabling them in that behalf, hereby make the following Order:
1981 c. 22; see section 86(1) for the definition of “the Ministers”. The functions of the Secretary of State were transferred to the Scottish Ministers by virtue of section 53 of the Scotland Act 1998 (c. 46).

Citation, commencement and extent
1. (1) This Order may be cited as the Diseases of Animals (Approved Disinfectants) Amendment (Scotland) Order 2003 and shall come into force on 30th June 2003.
(2) This Order extends to Scotland only.

Amendments to the Diseases of Animals (Approved Disinfectants) Order 1978
2. (1) The Diseases of Animals (Approved Disinfectants) Order 1978 shall be amended as follows:–
S.I. 1978/32, as last relevantly amended by S.I. 1978/934 and 1999/919, and S.S.I. 2001/45 and 51.
(a) in article 3(2) and (4) (special disease and general orders), after “Schedule 1” insert “or Schedule 2”;
(b) in article 4 (approved disinfectants), for “Schedule 1” substitute “either Schedule 1 or Schedule 2”;
(c) at the end of article 5(3) (disinfectants listed in Schedule 1) insert–

“, unless it is then added to the disinfectants listed in column 1 of Schedule 2”.

(d) after article 5 insert–

“Disinfectants listed in Schedule 2
6. (1) A disinfectant listed in column 1 of Schedule 2 is approved for use, and may be used, only under and for the purposes of an order in the column relating to which (in that Schedule) a dilution rate is specified opposite the name of that disinfectant, and may, subject to the provisions of article 8, be used under an order only at the dilution rate so specified.
(2) A disinfectant listed in column 1 of Schedule 2 shall remain an approved disinfectant until 31st August 2003.”

;
A previous article 6 was omitted by S.S.I. 2001/45.
(e) for Schedule 1 (approved disinfectants), substitute Schedule 1 to this Order; and
(f) after Schedule 1 insert the Schedule set out in Schedule 2 to this Order.

Revocations
3. (1) Article 2(4)(a), (5), (6), (7) and (9) of the Diseases of Animals (Approved Disinfectants) Amendment (Scotland) Order 2001 is revoked.
S.S.I. 2001/45.
(2) The Diseases of Animals (Approved Disinfectants) Amendment (No. 2) (Scotland) Order 2001 is revoked.
S.S.I. 2001/51
ALLAN WILSON
Authorised to sign by the Scottish Ministers
St Andrew’s House, Edinburgh
26th June 2003

SCHEDULE 1 Schedule to be substituted for Schedule 1 to the Diseases of Animals (Approved Disinfectants) Order 1978
Article 2(e)

“SCHEDULE 1 APPROVED DISINFECTANTS
Articles 4 and 5
Orders in respect of which use is approved; and dilution rates					
Disinfectant	Foot and Mouth Disease Orders	Swine Vesicular Diseases Orders	Diseases of Poultry Order	Tuberculosis Orders	General Orders
Action Iodophor Disinfectant (New Formulation)	525	400	150	15	110
Agilan Red Label	550	600	125	30	180
Agri Disinfex	550	600	125	30	180
AgriGene	–	–	–	–	50
Agrimar Iodophor Disinfectant	550	600	125	30	180
Agrisept MC Tabs	271 The volume of mls. of water to which 1 g of the product is to be added.	448	271	–	450
Alzogur	–	–	–	–	2
Alodine (New Formulation)	525	400	150	15	110
Alpharma Vetrechlor	271	448	271	–	450
Alpharma Vetredine	550	600	125	30	180
Alpharma Vetrekill	60	300	150	10	50
Alpharma Vetrekill 200	840	400	200	29	82
Alpharma Vetroxide PA	99	20	350	61	158
Annihilate	50	30	20	–	30
Annihilate ACR	50	30	20	–	30
Antec Ambicide	–	–	–	–	30
Antec Black Fluid	–	–	52	–	60
Antec Chicgard	–	–	–	–	31
Antec Farm Fluid	219	100	39	24	29
Antec Farm Fluid S	700	200	200	50	115
Antec Hipodine	450	300	130	30	180
Antec Hyperox	150	50	375	100	179
Antec Longlife	–	–	60	–	60
Antec Longlife 200	–	160	200	–	–
Antec Longlife 250 S	500	200	250	48	90
Antec New Formula Farm Fluid	300	110	70	30	65
Antec New Formula Farm Fluid Extra	250	150	80	60	85
Antec New Formula White Fluid	–	–	45	83	103
Antec Ovation	–	–	–	–	46
Antec Safehands	–	–	–	–	2
Antec Virkon E	1300	200	280	–	120
Antec Virkon S	1300	200	280	–	120
Antec Virudine	600	650	140	51	125
Antigermen Potente	525	400	150	15	110
Avi-Cleanse	240	300	80	25	100
Bactacol KK Disinfectant (New Formulation)	80	250	190	–	–
Bactipal 5.22	500	80	150	135	200
Bactipal DB	500	80	150	90	178
Ballista	200	–	200	–	200
Barrier V1	–	–	50	–	40
Battles Black Disinfectant Fluid	–	–	45	–	60
Battles Iofarm Iodophor Disinfectant & Dairy Detergent Steriliser	550	600	125	30	180
Battles Universal Disinfectant Fluid	300	–	60	37	–
Battles White Disinfectant Fluid	–	–	50	50	60
Betane Plus	–	–	50	–	15
Biocid	525	400	150	15	110
Biocid 30	550	600	125	30	180
Bio – Cleanse	1100	120	150	–	100
Bio-Dine	–	–	145	–	–
Bio-Guard	–	–	80	–	–
Bio-Kill	–	–	365	–	–
Bio-Phen	–	175	190	–	–
Bio-Phen Plus	–		210	–	–
Bio-Shield	–	–	155	–	–
Biotal Pet Disinfectant	–	–	–	–	Use undiluted
Bio-VX	–	–	285	–	–
Black Disinfectant	–	–	41	–	80
Black Disinfectant 34+	–	–	–	–	77
Blitz	800	160	145	44	256
Breaker	200	–	200	–	200
C S Disinfectant	–	–	65	–	40
Carela Bio-Des	99	–	–	–	–
Carela Bio Plus	9	–	–	–	–
Cascade Disinfectant	800	160	145	44	256
Centiklene Black Fluid Disinfectant	–	–	20	–	–
Citric Acid BP	500	–	–	–	–
Citrox	–	–	0.66	–	–
Clearsol	–	–	–	45	–
Clinidine	320	–	140	–	–
Combat 2	550	600	125	30	180
Commando (New Formulation)	80	250	190	–	–
Cromessol New Animal Health Care Disinfectant (New Formulation)	80	250	190	–	–
D50	800	160	145	–	256
Deocide PA Disinfectant (2)	800	160	145	44	256
Deosan Iodel FD	215	234	130	26	147
Deptil AF	–	–	100	–	–
Disteola	240	300	80	25	100
Divosan DB	–	–	60	–	49
Emprasan Approved Iodine Disinfectant	–	–	–	–	111
Envirocare A	99	99	99	–	99
Envirocide	550	600	125	30	180
Enviroguard	60	300	150	10	50
Equigard	–	50	100	–	22
Equisept	271	–	–	–	450
ERFS White Disinfectant Fluid	–	–	50	50	60
Euractiv S+	99	300	150	90	37
Everbrite FG Extra	–	–	10	–	–
F10SC Veterinary Disinfectant	–	–	35	–	9
F10SC General Farm Disinfectant	499	–	–	–	–
FAM	525	500	100	15	110
FAM (New Formulation)	525	400	150	15	110
FAM 30	550	600	125	30	180
FAM 30C	891	970	200	48	290
Farmodyne	550	600	125	30	180
Farm Oxysan Plus	200	30	300	–	300
Farmcare 95 (New Formulation)	80	250	190	–	–
FarmKlear	80	250	190	–	–
Farmsan	550	600	125	30	180
FH7	60	300	150	10	50
Formalin BP (Containing not less than 34% Formaldehyde)	9	9	–	–	–
Genus Universal (New Formulation)	550	600	125	30	180
GeoSIL	–	–	–	–	9
Germacert FG Plus	–	–	10	–	–
GPC8	80	–	200	–	–
GPC8 (New Formulation)	80	250	190	–	–
Halamid	200	90	1000	20	300
Hemex Chlor Powder	–	2000	500	–	530
Hemexol Iodine Liquid	160	140	100	–	110
Hemexol Iodine Liquid Plus	–	800	200	–	200
Hemexol Liquid G	–	50	75	–	18
Hemexol V 260	–	220	260	–	103
Hemexol Virucidal Powder	1300	–	–	–	–
HPPA	–	–	400	–	–
Hycolin	–	–	40	–	28
Hyprelva 4+	–	400	90	16	37
Hyprelva SF	99	300	150	90	37
Hyspray PA 5	99	20	350	61	158
Impact	1300	300	300	–	112
Incidin AL	30	400	90	–	19
Incidin OXI	500	80	150	–	178
Incidin PD	–	–	20	–	32
Intercept	150	450	200	–	–
Iodel FD II	450	500	145	–	150
Iodet	525	500	100	15	110
Iodosure Bio	240	160	110	25	25
Jewel-Black 34	–	–	–	–	77
Jeyes Fluid	–	–	30	–	50
Kennel Safe Disinfectant (New Formulation)	80	250	190	–	–
Kick Start (2)	800	160	145	44	256
Kilcrobe WO Disinfectant Fluid Special Grade	–	–	–	–	99
Killgerm Black Disinfectant RW Coefficient 18/22	–	–	41	–	80
Killgerm Iodair	250	260	61	–	–
Killgerm Lysol BP	–	–	50	39	49
Killgerm White Farm Disinfectant	–	–	21	66	100
Kirbychlor	2 71	448	271	–	450
Life Guard (New Formulation)	80	250	190	–	–
Lifeline	–	50	75	–	18
Lindores 30	550	600	125	30	180
Lysol BP 1968	9	–	39	39	49
Lysovet PA	50	–	50	–	–
Macroclor	271	448	271	–	450
Macroclor 1000	–	2000	500	–	530
Macrodyne 200	–	800	200	40	200
Macrokil 200	–	300	220	–	64
Macroline-500	–	220	260	–	103
Macromist	–	–	50	–	15
Maskells Omnicide	60	300	150	10	50
Master SVD Solution	–	9	–	–	–
Maxi Guard	240	300	80	25	100
Micro-Chlor	–	100	250	–	210
Microcide 755N	–	–	50	–	15
Microdine	160	140	100	–	110
Microl-Plus	–	–	60	65	70
Micro-Quat	–	–	–	–	15
Milton Double Concentrate	–	100	–	–	25
Mira 8	80	250	190	–	–
Mira 30	550	600	125	30	180
MP36	99	99	99	–	99
Novagen FP	240	180	80	22	145
Omnicide	60	300	150	10	50
Omnicide Extra	–	300	175	38	27
Ortho-phosphoric Acid (Technical Grade)	330	–	–	–	–
Ovitek Biocidal Sol. Concentrate	–	–	200	–	25
Oxykil	800	160	145	–	256
Oxysan Max	–	–	365	–	–
P100 (New Formulation)	80	250	190	–	–
Parvocide Plus	60	300	150	10	50
Peratol	75	75	100	75	200
Perbac Farm	800	160	145	–	256
Peroxide	1320	220	–	–	–
Pet Safe	–	–	Use undiluted	–	–
Pet Vsan	1100	120	150	–	100
Phenoxide	–	–	260	–	–
Phoraid Disinfectant	–	–	–	–	25
Phor-Vet	–	–	–	–	25
Pinalene	–	–	–	–	11
Polykil+ Disinfectant	–	300	–	–	180
Powercide	1300	300	300	–	112
Powerkill	1300	300	300	–	112
Pro – Cleanse	1100	120	150	–	100
Prodophor	–	700	155	–	160
Prosept	–	240	130	–	–
Protekol	–	–	250	–	–
ProVSan	1100	120	150	–	100
Proxide	–	250	400	–	160
Proxitane AHC (2)	800	160	145	44	256
Prozone	–	–	500	–	256
Purogene	250	240	20	20	22
QC Iodocleanse	–	–	140	–	–
QC Virukill 260	–	–	260	–	–
Quatdet Clear	–	–	–	–	13
Rapicid	550	600	125	30	180
Response 904 Vet	–	–	29	–	–
Ryodophor SP	240	160	91	25	145
San Protect WS	99	300	150	90	37
San-5-Pine	–	–	–	–	11
Secure Iodophor Disinfectant	150	–	30	–	–
Septrivet 17	299	299	449	–	299
Sodium Carbonate (Decahydrate) Complying with BS 3674 of 1963	24	–	–	–	–
Sodium Hydroxide	–	100	–	–	–
Somplex Detsan	–	–	–	–	8
Sorgene 5	75	75	100	75	200
Sorgene Biodine	215	234	130	26	147
Stableguard	150	450	200	–	200
Stable Safe Disinfectant (New Formulation)	80	250	190	–	–
Steril Tabs	200	–	200	–	200
Sterilite 2000	1300	300	300	–	112
Sterilite Farm Disinfectant Extra	840	400	200	29	82
Sterilite PA	800	160	145	44	256
Sterilite Virucidal Disinfectant	60	300	150	10	50
Sterilite White Disinfectant	–	–	45	–	–
Sudol	–	–	60	65	70
Sulphamic Acid	500	–	–	–	–
Supercide	150	450	200	–	–
Supercide Max	–	–	155	–	–
Supercide Plus	–	300	175	–	27
Superdine	550	600	125	30	180
Superdine Plus	–	–	145	–	–
Super Fluid F	–	175	190	–	–
Superguard	150	450	200	–	200
Superkill	–	50	100	–	22
Superkill Plus	–	–	80	–	–
Superperacetic	800	160	145	–	256
Superperacetic Plus	–	–	365	–	–
Super Strong F	–	–	210	–	–
Super Virucidal	–	–	285	–	–
SWC Bacto Detsan Defoamed	20	10	–	–	10
SWC Bacto Detsan	20	10	–	–	10
SWC Broadol (New Formulation)	80	250	190	–	–
SWC Maxikleen	600	400	100	45	43
SWC V3	1300	300	300	–	112
Tego 2000	–	–	–	–	32
Tego 2001	–	–	–		16
Tegodor Farm	–	–	51	–	–
Terminal Black-Black Fluid RW 34	–	–	–	–	77
Terminol	–	–	–	–	33
TK10	150	450	200	–	–
TK12	–	50	100	–	22
Total	50	30	20	–	30
Total Farm Disinfectant	550	600	125	30	180
V26	200	200	300	105	200
Vanodin	525	400	150	15	110
Vanodine	525	400	150	15	110
Vanodine FAM	525	400	150	15	110
Vanodox	200	30	300	–	300
Venno FF Super	50	–	150	25	88
Vesphene D39	10	–	50	70	55
Vibacide	100	–	40	6	17
Viraguard (New Formulation)	80	250	190	–	–
Virex	1300	200	300	–	112
Virkon Professional	1300	200	280	–	120
VI-RID	–	–	10	–	–
Virochlor	271	448	271	–	450
Viro-Cid	100	250	150	50	–
Virofree	200	–	300	–	150
Viroguard	–	–	175	–	–
Virokill	60	300	150	10	50
Virophen	–	200	210	–	–
Virophen Plus	–	–	240	–	–
Virophor 2.8%	–	–	185	–	–
Viroshield	–	–	165	–	–
Viroxide Super	1320	220	–	–	–
Virucidal Extra	1300	300	300	–	112
Virucidal Extra Mk 2	–	200	300	–	90
Virucidal Plus	280	110	150	–	77
Virudine	–	–	140	–	–
Zal Fluid	–	–	–	–	77
Zal GQ Disinfectant	60	300	150	10	50
Zal Perax (2)	800	160	145	44	256
Zoetox 5	–	–	50	–	50”

SCHEDULE 2 Schedule to be added to the Diseases of Animals (Approved Disinfectants) Order 1978
Article 2(f)

“SCHEDULE 2 APPROVED DISINFECTANTS SUBJECT TO TRANSITIONAL PROVISIONS
Articles 4 and 6
Orders in respect of which use is approved; and dilution rates					
Disinfectant	Foot and Mouth Disease Orders	Swine Vesicular Disease Orders	Diseases of Poultry Order	Tuberculosis Orders	General Orders
Action Iodophor Disinfectant	525	500	100	15	110
Agrimar White Fluid	–	–	40	79	111
Alodine	525	500	100	15	110
Bactacol KK Disinfectant	80	–	200	–	–
Carbo White Disinfectant	–	–	40	79	111
Commando	80	–	200	–	–
Cromessol New Animal Health Care Disinfectant	80	–	200	–	–
Defender	–	–	40	79	111
Emprasan Approved White Disinfectant	–	–	40	79	111
Evans White Disinfectant	–	–	40	89	111
Farmcare 95	80	–	200	–	–
Farm Disinfex +	–	–	40	79	111
F&M Cept	150	450	200	–	200
Hycovet W24	–	–	60	91	113
Kennel Safe Disinfectant	80	–	200	–	–
Life Guard	80	–	200	–	–
Marbolic White Disinfectant	–	–	40	79	111
P100	80	–	200	–	–
Rygentas Farm Disinfectant	–	–	40	79	111
Sorgene White	–	–	40	79	111
Stable Safe Disinfectant	80	–	200	–	–
Sterilite White Farm Disinfectant	–	–	40	79	111
Superfine White Disinfectant	–	–	40	79	111
Superwhite Plus Farm Disinfectant	–	–	40	79	111
SWC Broadol	80	–	200	–	–
SWC Super White	–	–	40	79	111
Unilite	–	–	40	79	111
Vanodine Farm Disinfectant	–	–	40	79	111
Vetrechlor	–	448	271	–	450
Vetredine	550	600	125	30	180
Vetrekill	60	300	150	10	60
Vetrekill 200	840	400	200	29	82
Vetrewhite	–	–	40	79	111
Vetroxide PA	–	20	100	61	158
Viraguard	80	–	200	–	–
White Disinfectant	–	–	40	79	111
White Farm Disinfectant	–	–	40	79	111
Xtra Germicide	–	–	40	79	111
Zal Germicide	–	–	40	79	111”

(This note is not part of the Order)
This Order, which extends to Scotland only, amends the Diseases of Animals (Approved Disinfectants) Order 1978 (“the 1978 Order”). Its effects are to substitute for Schedule 1 to the 1978 Order the Schedule 1 in this Order and to add a Schedule 2 to the 1978 Order (article 2). Schedule 1 provides an updated list of disinfectants approved by the Scottish Ministers. Schedule 2 lists disinfectants which, although no longer approved, can continue to be used as approved disinfectants until 31st August 2003.
The Order also makes consequential amendments and revocations (articles 2 and 3).
This Order was notified in draft to the European Commission in accordance with Directive 98/34/EC (O.J. No. L 204, 21/07/98, p.37) as amended by Directive 98/48/EC (O.J. No. L 217, 05/08/98, p.18).
A Regulatory Impact Assessment has not been prepared in respect of this Order.