SCHEDULE

SCHEDULE 2 AS SUBSTITUTED BY THESE REGULATIONS
Regulation 2(5)
SCHEDULE 2

VOUCHER VALUES – REPAIR
Regulation 19(2) and (3)
Column 1 | Column 2
Nature of Repair to Appliance | Letter Codes – Values
| A | B | C | D | E | F | G | H&I
| £ | £ | £ | £ | £ | £ | £ | £
Repair or replacement of one lens | 9.50 | 17.45 | 25.85 | 65.60 | 20.60 | 27.75 | 34.75 | 72.75
Repair or replacement of two lenses | 19.00 | 34.90 | 51.70 | 131.20 | 41.20 | 55.50 | 69.50 | 145.50
Repair or replacement of: | | | | | | | |
the front of a frame | 9.75 | 9.75 | 9.75 | 9.75 | 9.75 | 9.75 | 9.75 | 9.75
a side of a frame | 5.80 | 5.80 | 5.80 | 5.80 | 5.80 | 5.80 | 5.80 | 5.80
the whole frame | 11.50 | 11.50 | 11.50 | 11.50 | 11.50 | 11.50 | 11.50 | 11.50