Dissolution and Revocation
7
1
The Clinical Standards Board for Scotland and the Health Technology Board for Scotland are hereby dissolved.
2
The Clinical Standards Board for Scotland Order 1999 and the Health Technology Board for Scotland Order 2000 are hereby revoked.
S.I.
1999/726
.
S.S.I. 2000/47.