Interpretation
2
1
For the purposes of this Order–
- “the Act” means the National Health Service (Scotland) Act 1978;
- “the Board” means the Special Health Board, to be known by the name of the National Waiting Times Centre Board, which is constituted by this Order.
2
In this Order unless the context otherwise requires, a reference to an article or Schedule is to an article of, or the Schedule to, this Order and a reference to a paragraph is to a paragraph of the article in which the reference is made.