Variation of Electricity Lands (Rateable Values) (Scotland) Order 2000
3
In article 2(1)–
a
in the definition of “a Company”–
i
the word “or” at the end of sub–paragraph (ii) and the word “and” at the end of sub–paragraph (iii) shall be omitted;
ii
after sub-paragraph (a)(iii), there shall be inserted–
iv
Scottish Power Generation Limited; or
v
SSE Generation Limited;
; and
iii
for sub paragraph (b) there shall be substituted–
b
for the purposes of article 3(1)(b) and Part III of this Order means–
i
Scottish Power UK plc;
ii
Scottish and Southern Energy plc;
iii
SP Distribution Limited;
iv
Scottish Hydro-Electric Power Distribution Limited; or
v
SP Power Systems Limited; and
c
for the purposes of article 3(1)(c) and Part IV of this Order means–
i
Scottish Power UK plc;
ii
Scottish and Southern Energy plc;
iii
SP Transmission Limited; or
iv
Scottish Hydro-Electric Transmission Limited;
; and
b
after the definition of “generating plant” there shall be inserted–
- “predecessor company” for the purposes of articles 5(2), 8(2) and 11(2) means Scottish Power UK plc or Scottish and Southern Energy plc as the case may be;
.