SCHEDULE
Article 2(8)
PART I

ENTRIES TO BE DELETED FROM SCHEDULE 1 TO THE 1978 ORDER
- Genie 11;
- Genus Universal Disinfectant;
- Killgerm Px-Parvo 11;
- TriGene 11;
- ZAL Universal
PART II

ENTRIES TO BE SUBSTITUTED FOR CORRESPONDING ENTRIES IN SCHEDULE 1 TO THE 1978 ORDER
Disinfectant | Orders in respect of which use is approved; and dilution rates
| Foot-and-Mouth Disease Orders | Swine Vesicular Disease Orders | Diseases of Poultry Order | Tuberculosis Orders | General Orders
Arrow Vibac | 100 | — | 40 | 6 | 17
Hycolin | — | — | 40 | — | 28
Kleencare DS 680 | 30 | 400 | 90 | — | 19
Vibacide | 100 | — | 40 | 6 | 17
PART III

ENTRY TO BE ADDED TO SCHEDULE 1 TO THE 1978 ORDER
Disinfectant | Orders in respect of which use is approved; and dilution rates
| Foot-and-Mouth Disease Orders | Swine Vesicular Disease Orders | Diseases of Poultry Order | Tuberculosis Orders | General Orders
Genus Universal (new formulation) | 550 | 600 | 125 | 30 | 180