SCHEDULE 3

CHARGES FOR FABRIC SUPPORTS AND WIGS
Regulation 6
Column 1 | Column 2
Specified Appliance | Specified Sum
Surgical Brassiere | £20.60
Abdominal or Spinal Support | £31.00
Stock Modacrylic Wig | £50.70
Partial Human Hair Wig | £133.70
Full Bespoke Human Hair Wig | £195.40